en	Queries

en	Authentication

en	WMI Management

en	WMI Data

en	WMI Data Query

en	%d Minute

en	%d Minutes

en	%d Hour

en	%d Hours

en	%d Day

en	Utilities

en	WMI Query Tool

en	Data Collection

en	WMI Queries

en	Template Editor

en	WMI Autenication

en	(Edit)

en	(Query)

en	WMI Account Options

en	WMI Authentication Account

en	Choose an account to use when Authenticating via WMI

en	1 Process

en	%d Processes

en	WMI Settings

en	Enable WMI Data Collection

en	Check this box, if you want the WMI Plugin to query Windows devices.

en	Concurrent Processes

en	How many concurrent WMI queries do you want the system to run?

en	Auto Create WMI Queries

en	If selected, when running either automation, or when creating/saving a Device, all WMI Queries associated with the Device Template will be created.

en	Misc

en	Associated WMI Queries

en	Name

en	Status

en	WMI Query Exists

en	WMI Query Does Not Exist

en	No Associated WMI Queries.

en	Delete

en	Add WMI Query

en	Add

en	Add WMI Query to Device Template

en	Click 'Continue' to delete the following WMI Queries will be disassociated from the Device Template.

en	WMI Query Name: %s

en	Cancel

en	Continue

en	Remove WMI Query

en	Give this account a meaningful name that will be displayed.

en	Username

en	The username that will be used for authentication. Please also include the domain if necessary.

en	Password

en	The password used for authentication.

en	Press 'Continue' to delete the following accounts.

en	You must select at least one account.

en	Account [edit: %s]

en	Account [new]

en	WMI Accounts

en	Search

en	Accounts

en	Default

en	Go

en	Clear

en	Description

en	Devices

en	No Accounts Found

en	Give this query a meaningful name that will be displayed.

en	Collection Frequency

en	When this WMI Query is added to a Device, this is the Frequency of Data Collection that will be used.

en	Enabled

en	Should this Query be enabled on hosts using it

en	Namespace

en	The Namespace for this Query.

en	Query

en	The Query to execute for gathering WMI data from the device.

en	Primary Key

en	When a WMI Query returns multiple rows, which Keyname will be the primary key or index? If the Primary Key includes multiple columns, separate them with a comma.

en	Click 'Continue' to Delete the following WMI Queries.

en	You must select at least one WMI Query.

en	Return

en	Delete WMI Query

en	Query [edit: %s]

en	Query [new]

en	Has Graphs

en	ID

en	Frequency

en	WQL Query

en	Get Computer Information

en	Get System Processes

en	Get Installed Software

en	Get Operating System Information

en	Get OD Service Information

en	Get System Enclosure Information

en	Get System Physical Memory Information

en	Get Memory Device Details

en	Get System BIOS Information

en	Get System Baseboard Information

en	Get Processor Information

en	Ping a Known Address from Computer

en	Get Row System OS Performance Data

en	Get Formatted System OS Performance Data

en	Get Formatted Phsycal Disk Performance Data

en	Get Raw Phsycal Disk Performance Data

en	Get Logical Disk Information

en	Get Formatted Logical Disk Performance Data

en	Get Raw Logical Disk Performance Data

en	Get Formatted CPU Performance Data

en	Get Raw CPU Performance Data

en	Get Raw Memory Performance Data

en	Get Formatted Network Performance Data

en	Get Raw Network Performance Data

en	Get Network Adapter Information

en	Get Computer Asset Information

en	Name Space

en	Close

en	If you need assistance on error codes, use google, or here use the following Link %s.

en	Microsoft Common WBEM Errors

en	Distributed COM Setup

en	For WMI to work the user account you are using must be granted Distributed COM permissions, and the Windows Firewall must be configured to allow Distributed COM communications. You can find a real good document on this procedure at the following Link %s.

en	Host

en	Command

en	More Class Information @Microsoft

en	Run

en	Run the WMI Query against the Device

en	Clear

en	Clear the results panel.

en	Pick from a list of common queries.

en	Get some help on setting up WMI

en	Help

en	Create a new WMI Query from the existing Query.

en	Query Results

en	Common Queries (Click to Select)

en	WMI Setup Assistance

en	ERROR: You must provide a host, username, password and query

en	WMI Query Results for Device: %s, Class: %s, Columns: %s, Rows: %s

en	Showing columns and first one or two rows of data.