en	None

en	%d Minute

en	%d Minutes

en	%d Seconds

en	Delete

en	Disable

en	Enable

en	Duplicate

en	Name

en	A Useful Name for this Proxy.

en	New Proxy

en	Hostname

en	The Proxy Hostname.

en	HTTP Port

en	The HTTP Proxy Port.

en	HTTPS Port

en	The HTTPS Proxy Port.

en	User Name

en	The user to use to authenticate with the Proxy if any.

en	Password

en	The user password to use to authenticate with the Proxy if any.

en	General Settings

en	Display Name of this server

en	Enable Server

en	Enable Servers

en	Uncheck this box to disabled this server from checking urls.

en	Is this server the local server?

en	Check this box if the current server you are connected to is this entry.

en	Master Server

en	Sets this server to the Master server. The Master server handles all Email operations

en	IP Address

en	IP Address to connect to this server

en	URL

en	This is the URL to connect to remote.php on this server.

en	Location

en	Location of this server

en	Service Check Name

en	The name that is displayed for this Service Check, and is included in any Alert notifications.

en	Enable Service Check

en	Uncheck this box to disabled this url from being checked.

en	The URL to Monitor

en	Enter an IP address to connect to. Leaving blank will use DNS Resolution instead.

en	Proxy Server

en	If this connection text requires a proxy, select it here. Otherwise choose 'None'.

en	Compression

en	What compression does the server require? Most servers should not need this, but some will not redirect properly without it.

en	Available Checks

en	Requires Authentication

en	Check this box if the site will normally return a 401 Error as it requires a username and password.

en	Check Certificate

en	If using SSL, check this box if you want to validate the certificate. Default on, turn off if you the site uses a self-signed certificate.

en	Notification Timing

en	Trigger

en	How many minutes the URL must be down before it will send an alert. After an alert is sent, in order for a 'Site Recovering' Email to be send, it must also be up this number of minutes.

en	Time Out

en	How many seconds to allow the page to timeout before reporting it as down.

en	Verification Strings

en	Response Search String

en	This is the string to search for in the URL response for a live and working Web Service.

en	Response Search String - Maintenance Page

en	This is the string to search for on the Maintenance Page. The Service Check will check for this string if the above string is not found. If found, it means that the Web Service is under maintenance.

en	Response Search String - Failed

en	This is the string to search for a known failure in the Web Service response. The Service Check will only alert if this string is found, ignoring any timeout issues and the search strings above.

en	Notification Settings

en	Notify Format

en	This is the format to use when sending the notification email

en	Notification List

en	Use this Notification List for those to be notified when this website goes down.

en	Notify Accounts

en	This is a listing of accounts that will be notified when this website goes down.

en	Extra Alert Emails

en	You may specify here extra Emails to receive alerts for this URL (comma separated)

en	Checks

en	Servers

en	Proxies

en	Log History

en	Cacti Master

en	Cacti Remote Server

en	Web Service Check Admin

en	Management

en	Web Service Checks

en	WebSeer Service Checks

en	Service Check Edit

en	Service Check Save

en	WebSeer Servers

en	Server Edit

en	Save Server

en	WebSeer Proxies

en	Proxie Edit

en	Save Proxy

en	Click 'Continue' to Delete the following URL.

en	Click 'Continue' to Delete following URLs.

en	Cancel

en	Continue

en	Delete URL

en	Delete URLs

en	Click 'Continue' to Disable the following URL.

en	Click 'Continue' to Disable following URLs.

en	Disable URL

en	Disable URLs

en	Click 'Continue' to Enable the following URL.

en	Click 'Continue' to Enable following URLs.

en	Enable URL

en	Enable URLs

en	Click 'Continue' to Duplicate the following URL.

en	Click 'Continue' to Duplicate following URLs.

en	Duplicate URL

en	Duplicate URLs

en	The Service Check history was purged for %s

en	Query [edit: %s]

en	Query [new]

en	No Users Selected

en	Users Selected

en	All Users Selected

en	All

en	Search

en	Date

en	Error

en	HTTP Code

en	DNS

en	Connect

en	Redirect

en	Total

en	Urls

en	Service Down

en	Service Restored

en	No Service Check Events in History

en	Actions

en	Status

en	Enabled

en	Auth

en	Timeout

en	Last Check

en	Edit Service Check

en	Disable Service Check

en	View Service Check History

en	DNS: Server %s - A Record for %s

en	N/A

en	Down

en	Up

en	Disabled

en	No Servers Found

en	Webseer Service Checks

en	State

en	Any

en	Refresh

en	Default

en	Go

en	Clear

en	Webseer Service Check History

en	Date Search

en	Entries

en	Purge Events

en	Click 'Continue' to delete the following Proxy.

en	Click 'Continue' to delete following Proxies.

en	Delete Proxy

en	Delete Proxies

en	Proxy [edit: %s]

en	Proxy [new]

en	Ports (http/https)

en	Username

en	Not Set

en	Webseer Proxy Management

en	Click 'Continue' to Delete the following Server.

en	Click 'Continue' to Delete following Servers.

en	Delete Server

en	Delete Servers

en	Click 'Continue' to Disable the following Server.

en	Click 'Continue' to Disable following Servers.

en	Disable Server

en	Disable Servers

en	Click 'Continue' to Enable the following Server.

en	Click 'Continue' to Enable following Servers.

en	No Events in History

en	Master

en	This Host

en	Edit Server

en	View Server History

en	No

en	Yes

en	Webseer Servers

en	Triggered

en	Webseer Server History