en	From %d Day Ago

en	From %d Years Ago

en	Down Host Mail

en	Up Host Mail

en	Down Host Cmd

en	Up Host Cmd

en	Auto

en	0 Digits

en	1 Digit

en	> %d %%% of Devices Globally
vi	Thiết bị

en	> %d %%% of Devices in a Site
vi	Thiết bị

en	Checking this box will switch Thold from performing inline Notification to using either the Notification Daemon, or notifications performed out of band by the Notification poller.

en	Check this box if you wish Warning Notification List recipients to receive Alert Emails in addition to the Alert Notification list receivers. This case is applicable when Warning Notifications goes to Administrators and Alert Notifications go to Management.

en	Checking this box will enable Threshold Daemon debug when operating from SystemD or through the command line. This change is dynamic and will take effect as soon as the next Threshold loop commences.

en	Daemon Threads

en	1 Process

en	%d Processes

en	Supported for Notification Lists and the Notification Queue only. If there are Down Device Notifications in a single processing cycle. Send only one Email to Notification List repipients for all Devices.

en	If a large influx of Down Device Notifications come in, Cacti can pause sending out those Notifications for a certain period of time to see if the issue is transient before sending them out. Select the threshold Down Device Notifications before the Pause is Triggered.

en	If you choose to delay Notifications for a large Down Devices Notification inrush, how long are you willing to wait before allowing the notifications to be processed?

en	To disable all notifications from this Notification List, you can simply disable it here.

en	Email Style/Format File

en	Choose the custom html wrapper and CSS file to use. This file contains both html and CSS to wrap around your report. If it contains more than simply CSS, you need to place a special <REPORT> tag inside of the file. This format tag will be replaced by the report content. These files are located in the 'formats' directory.

en	Notification has been Suspended. Press the Resume button to resume it

en	Notification has been Resumed. Press the Suspend button to suspend it

en	Pending Notifications have been removed from the database. Previously sent notification not purged will remain until they age out.

en	Event Notifications [ Notifications Suspended by User: %s, %s ago ]

en	Topic

en	Processed

en	Suspend

en	Resume

en	Purge

en	The name of the object as defined by the caller.

en	Object ID

en	The Object ID defined by the caller. Generally its unique 'id'.

en	Event Time

en	Has the Notification Event been processed.

en	Did this notification result in an error. Hover on the error column for details.

en	The time in seconds it took to process the event.

en	Not Specified

en	Done

en	Pending

en	Success

en	External ID

en	The Threshold Type. For Baseline Types: [TIP] refers to the Time In the Past with MIN, MAX, AVG, and LAST from no more than a day in time from that period. [AOT] refers to the Average over the entire Time period. If there is a colon followed by MIN, MAX, AVG, LAST, the Value came from that Consolidation Function.

en	Enabled at Template Level

en	A Threshold must be enabled both at the Template Level and the Threshold level to be checked.

en	The Graph End time will be set at the time of triggering. The Graph Start time will be the End Time minus the Graph Timespan.

en	Skip Scaling on HRULEs

en	If Checked, the Scale on the Graph will not be impacted by either the Alert or Warning HRULEs.

en	Numeric values for High and Low Thresholds can include the following suffixes for numbers greater than 1 to 'K', 'M', 'G', 'T', 'P', 'E', 'Z', 'Y', and for numbers less than 1 'm', 'u', 'p', 'f'.

en	The type of Baseline. [TIP] is the Time in Past, [AOT] is the Average over Time. Percentage Deviation is a percentage value from the historical value. Absolute Value is a deviation either above or below the Baseline over that historical value. For the [TIP] Baseline Types, the MIN, MAX, AVG, and LAST will come from no more than a one day time period at that point in time.

en	Consolidation Function

en	Minimum

en	Maximum

en	The Consolidation function to use for the Baseline Type value calculation.

en	Show Units

en	Display units for very large or small numbers.

en	Force Units Suffix

en	If you wish to display a forced unit suffix on the various Threshold pages and Notifications, enter it here. The size is limited to no more than 10 characters.

en	Decimal Digits to Display

en	The number of decimal digits to display for Threshold and Current Values. The default is auto or 2.

en	Style/Format File

en	Only logging, maint device

en	Impossible threshold: The Alert Trigger Count must be greater or eval to 1!

en	Impossible threshold: The Alert Trigger Count must be less than or equal to the Trigger Count or eval to 1!

en	Impossible threshold: The Warning Trigger Count must be greater or eval to 1!

en	Ack Detail

en	Date

en	Comment Not Found

en	Ack History

en	No Export Rows Found.