en	Indefinitely

en	%d Month

en	%d Months

en	%d Year

en	From %d Hour Ago

en	From %d Hours Ago

en	From %d Day Ago

en	From %d Days Ago

en	From %d Week Ago

en	From %d Weeks Ago

en	From %d Month Ago

en	From %d Months Ago

en	From %d Year Ago

en	From %d Years Ago

en	Down

en	Error

en	Recovering

en	Up

en	Unknown

en	Disabled

en	Not Monitored

en	Notify - Alert

en	Alert

en	Notify - Alert2Warning

en	Alert2Warn

en	Notify - Warning

en	Warning

en	Notify - Re-Trigger

en	Re-Trigger

en	Notify - Restoral

en	Restoral

en	Event - Alert Trigger

en	Alert Event

en	Event - Warning Trigger

en	Warning Event

en	Event - Restoral

en	Restoral Event

en	Event - Acknowledge

en	Acknowledge Event

en	Restore

en	Alert Trigger

en	Warn Trigger

en	Alert-Warn

en	Acknowledgment

en	Baseline Alert

en	Notice

en	Ok

en	Emergency

en	Critical

en	Info

en	Debug

en	Never

en	Every Minute

en	Every %d Minutes

en	Every Hour

en	Every %d Hours

en	Every Day

en	Every %d Days

en	Every Week

en	Every %d Weeks

en	Every Month

en	%d Minute

en	%d Minutes

en	%d Hour

en	%d Hours

en	%d Day

en	%d Days

en	%d Week

en	%d Weeks

en	%0.1f Hours

en	Every Polling

en	Every %d Pollings

en	%d Polling

en	%d Pollings

en	High / Low

en	Baseline Deviation

en	Time Based

en	%%% Deviation Min/Max [TIP]

en	%% Deviation Min/Max [TIP]

en	%%% Deviation CF [TIP]

en	%% Deviation CF [TIP]

en	Absolute Val Min/Max [TIP]

en	Absolute Val of CF [TIP]

en	%% Deviation Avg [AOT]

en	%%% Deviation Avg [AOT]

en	%% Deviation Avg of CF [AOT]

en	%%% Deviation Avg of CF [AOT]

en	Absolute Val Avg [AOT]

en	Absolute Val Avg of CF [AOT]

en	Exact Value

en	CDEF

en	Percentage

en	RPN Expression

en	Upper + Lower bytes

en	Acknowledge

en	Suspend Notifications

en	Resume Notifications

en	Delete

en	Enable

en	Disable

en	Reapply Suggested Names

en	Propagate Template

en	Export

en	Threshold Mail

en	Down Host Mail

en	Up Host Mail

en	Threshold Cmd

en	Down Host Cmd

en	Up Host Cmd

en	Auto

en	0 Digits

en	1 Digit

en	%d Digits

en	> %d Devices

en	> %d %%% of Devices Globally

en	> %d Devices in a Site

en	> %d %%% of Devices in a Site

en	SNMP not in use

en	N/A

en	Devices Notice: <DESCRIPTION> (<HOSTNAME>) returned from DOWN state

en	<br>System <DESCRIPTION> (<HOSTNAME>) status: <DOWN/UP><br><br>Site: <SITE><br>Location: <LOCATION><br>Current ping response: <CUR_TIME> ms<br>Average system response : <AVG_TIME> ms<br>System availability: <AVAILABILITY><br>Total Checks Since Clear: <TOT_POLL><br>Total Failed Checks: <FAIL_POLL><br>Last Date Checked UP: <LAST_FAIL><br>Devices Previously DOWN for: <DOWNTIME><br><br>SNMP Info:<br>Name - <SNMP_HOSTNAME><br>Location - <SNMP_LOCATION><br>Uptime - <UPTIMETEXT> (<UPTIME> ms)<br>System - <SNMP_SYSTEM><br><br>NOTE: <NOTES>

en	Devices Error: <DESCRIPTION> (<HOSTNAME>) is DOWN

en	DOWN

en	System Error : <DESCRIPTION> (<HOSTNAME>) is <DOWN/UP><br>Site: <SITE><br>Location: <LOCATION><br>Reason: <MESSAGE><br><br>Average system response : <AVG_TIME> ms<br>System availability: <AVAILABILITY><br>Total Checks Since Clear: <TOT_POLL><br>Total Failed Checks: <FAIL_POLL><br>Last Date Checked DOWN : <LAST_FAIL><br>Devices Previously UP for: <DOWNTIME><br>NOTE: <NOTES>

en	Thresholds

en	(actions)

en	(edit)

en	(save)

en	(add)

en	Threshold Logs

en	Device Status

en	Thresholds - Failures

en	Thresholds - Normal

en	Thresholds - Recovering

en	Recent Thresholds

en	Recent Device Failures

en	Threshold Templates

en	Threshold Template Import

en	Notification Lists

en	Notification Lists (edit)

en	Notification Queue

en	Management

en	Templates

en	Threshold

en	A template with that Data Source already exists!

en	Configure Thresholds

en	Configure Threshold Templates

en	Manage Notification Lists

en	View Thresholds

en	Normal User

en	Template Editor

en	General Administration

en	Device Up/Down Notification Settings

en	Threshold Up/Down Email Notification

en	Global List

en	List Below

en	Global and List Below

en	Which Notification List(s) of should be notified about Device Up/Down events?

en	Notification List

en	Additional Email address, separated by commas for multiple Emails.

en	Host Failure Count

en	The number of Polling Intervals at this Host must be Down before Thold logging an error and reporting Host as Down. Default is 0 (use Cacti setting)

en	Use Cacti Setting

en	%d Polling Interval

en	%d Polling Intervals

en	Alerting/Thold

en	General

en	Disable All Thresholds

en	Checking this box will disable Alerting on all Thresholds. This can be used when it is necessary to perform maintenance on your network.

en	Auto Create Thresholds

en	If selected, when running either automation, or when creating/saving a Device, all Thresholds associated with the Device Template will be created.

en	Consider Unknown Data as Zero

en	When checking Thresholds, if a Data Source returns Unknown Data ('U'), consider the value as zero for the Threshold check. You can also enable log this issue.

en	Default Management Status

en	Default Threshold management filter status.

en	Any

en	Breached or Triggered

en	Breached

en	Triggered

en	Enabled

en	Empty ifHighSpeed Default

en	When calculating Expression Thresholds, if the ifHighSpeed and ifSpeed come back as zero, use the following ifHighSpeed setting instead. Default ifHighSpeed will be 10000 for 10GE interfaces.

en	Notification Preferences

en	Disable Legacy Notifications

en	Checking this box will disable Legacy Alerting on all Thresholds. Legacy Alerting is defined as any Specific Email Alerts not associated with a Notification List.

en	Threshold Notification Templated

en	If checked, when creating at Threshold Template, its Notification Settings will, by default be owned by the Threshold Template.

en	Enable Command Execution

en	Checking this box will enable the ability to run commands on Threshold breach and restoral events.

en	Enable Per Thold Notification

en	Checking this box will enable the ability to maintain custom Email bodies for Thresholds.

en	Enable Notification Queue

en	Checking this box will switch Thold from performing inline Notification to using either the Notification Daemon, or notifications performed out of band by the Notification poller.

en	Enable Sending Alert Emails to Warning Notification Lists

en	Check this box if you wish Warning Notification List recipients to receive Alert Emails in addition to the Alert Notification list receivers. This case is applicable when Warning Notifications goes to Administrators and Alert Notifications go to Management.

en	Threshold Daemon

en	Enable Threshold Daemon

en	Checking this box will enable the use of a dedicated Threshold daemon. This can be used to increase system performance and/or to distribute Threshold monitoring to a separate server.

en	Force Threshold Daemon Debug

en	Checking this box will enable Threshold Daemon debug when operating from SystemD or through the command line. This change is dynamic and will take effect as soon as the next Threshold loop commences.

en	Daemon Down Notification Frequency

en	If the Thold Daemon is found to be down, send out an Email notification at this frequency.

en	Every %d Hour

en	Daemon Threads

en	The number of daemon threads to be handled by the Threshold Daemon.

en	1 Process

en	%d Processes

en	Logging

en	Log Threshold Breaches

en	Enable logging of all Threshold failures to the Cacti Log.

en	Show Data Source in Log

en	Show the Data Source name in the Log if not present.

en	Log Threshold Changes

en	Enable logging of all Threshold changes to the Cacti Log.

en	Debug Log

en	Enable logging of debug messages with Threshold

en	Alert Log Retention

en	Keep Threshold Logs for this number of days.

en	Log action Consider Unknown Data as Zero

en	When 'Consider Unknown Data as Zero' is enabled, log when it occurs

en	Syslog Settings

en	Syslog Enabled

en	If checked, when creating a new Threshold, by default new Threshold events will be sent to your local syslog. This setting is a preset. Threshold settings dictate actual syslog control.

en	Default Priority/Level

en	This is the default Priority/Level that Thold will use to send syslog messages. This setting is a preset. Threshold settings dictate actual syslog control.

en	Default Facility

en	This is the default Facility that Thold will use to send syslog messages. This setting is a preset. Threshold settings dictate actual syslog control.

en	Alert Presets

en	Weekend exemptions

en	If this is checked, Thold will not run on weekends.

en	Default Trigger Count

en	Default number of consecutive times the Data Source must be in breach of the Threshold for an Alert to be raised.

en	Re-Alerting

en	Repeat Alert after specified number of poller cycles.

en	Baseline Presets

en	Baseline Time Range Default

en	This is the default value used in creating Thresholds or templates.

en	Baseline Trigger Count

en	Default number of consecutive times the Data Source must be in breach of the calculated Baseline Threshold for an Alert to be raised.

en	Baseline Deviation Percentage

en	SNMP Notification Options

en	SNMP Notifications

en	Threshold status messages (informs/traps) will be sent to SNMP notification receivers. This includes Alerts, Warnings and Restoration traps per default. Note: This feature requires the Cacti SNMPAgent plugin.

en	Disable Warning Notifications

en	If this is checked, Threshold will not send a notification when a warning Threshold has been breached.

en	Disable Restoration Notifications

en	If this is checked, Threshold will not send a notification when the Threshold has returned to normal status.

en	Emailing Options

en	Send Emails with Urgent Priority

en	Allows you to set Emails with urgent priority

en	Send Alerts as Text

en	If checked, this will cause all Alerts to be sent as plain text Emails with no graph. The default is HTML Emails with the graph embedded in the Email.

en	Send Email separately for each address

en	If checked, this will cause all Emails to be sent separately for each address.

en	From Email Address

en	This is the Email address that the Threshold will appear from.

en	From Name

en	This is the actual name that the Threshold will appear from.

en	Device Notification Options

en	Enable Notifications

en	Enable Dead/Recovering host notification

en	Notification Single Email

en	Supported for Notification Lists and the Notification Queue only. If there are Down Device Notifications in a single processing cycle. Send only one Email to Notification List repipients for all Devices.

en	Device Notification Delay Options

en	Notification Delay

en	If a large influx of Down Device Notifications come in, Cacti can pause sending out those Notifications for a certain period of time to see if the issue is transient before sending them out. Select the threshold Down Device Notifications before the Pause is Triggered.

en	If you choose to delay Notifications for a large Down Devices Notification inrush, how long are you willing to wait before allowing the notifications to be processed?

en	Device Notification Email Options

en	Global Notification Email

en	This is the Email Address that the Dead Device Notifications will be sent to if the Global Notification List is selected.

en	Down Subject

en	This is the Email subject that will be used for Down Device Messages.

en	Device Error: <DESCRIPTION> (<HOSTNAME>) is DOWN

en	Down Message

en	This is the message that will be displayed as the message body of all UP / Down Device Messages (1024 Char MAX). HTML is allowed, but will be removed for text only Emails. There are several common replacement tags that may be used in include:<br>&#060HOSTNAME&#062 &#060HOST_ID&#062 &#060DESCRIPTION&#062 &#060SITE&#062 &#060LOCATION&#062 &#060UPTIME&#062 &#060UPTIMETEXT&#062 &#060DOWNTIME&#062 &#060TIME&#062 &#060DATE&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062 &#060MESSAGE&#062 &#060SUBJECT&#062 &#060DOWN/UP&#062 &#060SNMP_HOSTNAME&#062 &#060SNMP_LOCATION&#062 &#060SNMP_CONTACT&#062 &#060SNMP_SYSTEM&#062 &#060LAST_FAIL&#062 &#060AVAILABILITY&#062 &#060TOT_POLL&#062 &#060FAIL_POLL&#062 &#060CUR_TIME&#062 &#060AVG_TIME&#062 &#060NOTES&#062

en	System Error : <DESCRIPTION> (<HOSTNAME>) is <DOWN/UP><br><br>Site: <SITE><br>Location: <LOCATION><br>Reason: <MESSAGE><br>Average system response: <AVG_TIME> ms<br>System availability: <AVAILABILITY><br>Total Checks Since Clear: <TOT_POLL><br>Total Failed Checks: <FAIL_POLL><br>Last Date Checked DOWN : <LAST_FAIL><br>Device Previously UP for: <DOWNTIME><br>NOTES: <NOTES><br>Device NOTES: <DNOTES>

en	Recovering Subject

en	This is the Email subject that will be used for Recovering Device Messages.

en	Device Notice: <DESCRIPTION> (<HOSTNAME>) returned from DOWN state

en	Recovering Message

en	This is the message that will be displayed as the message body of all UP / Down Device Messages (1024 Char MAX). HTML is allowed, but will be removed for text only Emails. There are several common replacement tags that may be used in include:<br>&#060HOSTNAME&#062 &#060HOST_ID&#062 &#060DESCRIPTION&#062 &#060SITE&#062 &#060LOCATION&#062 &#060UPTIME&#062 &#060UPTIMETEXT&#062 &#060DOWNTIME&#062 &#060TIME&#062 &#060DATE&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062 &#060MESSAGE&#062 &#060SUBJECT&#062 &#060DOWN/UP&#062 &#060SNMP_HOSTNAME&#062 &#060SNMP_LOCATION&#062 &#060SNMP_CONTACT&#062 &#060SNMP_SYSTEM&#062 &#060LAST_FAIL&#062 &#060AVAILABILITY&#062 &#060TOT_POLL&#062 &#060FAIL_POLL&#062 &#060CUR_TIME&#062 &#060AVG_TIME&#062 &#060NOTES&#062

en	<br>System <DESCRIPTION> (<HOSTNAME>) status: <DOWN/UP><br><br>Site: <SITE><br>Location: <LOCATION><br>Current ping response: <CUR_TIME> ms<br>Average system response: <AVG_TIME> ms<br>System availability: <AVAILABILITY><br>Total Checks Since Clear: <TOT_POLL><br>Total Failed Checks: <FAIL_POLL><br>Last Date Checked UP: <LAST_FAIL><br>Device Previously DOWN for: <DOWNTIME><br><br>Snmp Info:<br>Name - <SNMP_HOSTNAME><br>Location - <SNMP_LOCATION><br>Uptime - <UPTIMETEXT> (<UPTIME> ms)<br>System - <SNMP_SYSTEM><br><br>NOTE: <NOTES><br>Device Notes: <DNOTES>

en	Status Change Command

en	When a Device changes state from a Cacti perspective (UP to DOWN or DOWN to RECOVERING/UP), run the following command. This command must NOT include command line arguments. However, the following variables can be pulled from the environment of the script:<br>&#060THOLD_HOSTNAME&#062 &#060THOLD_SITE&#062 &#060THOLD_LOCATION&#062 &#060THOLD_HOST_ID&#062 &#060THOLD_DESCRIPTION&#062 &#060THOLD_UPTIME&#062 &#060THOLD_UPTIMETEXT&#062 &#060THOLD_DOWNTIME&#062 &#060THOLD_TIME&#062 &#060THOLD_DATE&#062 &#060THOLD_DATE_RFC822&#062 &#060THOLD_BREACHED_ITEMS&#062 &#060THOLD_MESSAGE&#062 &#060THOLD_SUBJECT&#062 &#060THOLD_DOWNUP&#062 &#060THOLD_SNMP_HOSTNAME&#062 &#060THOLD_SNMP_LOCATION&#062 &#060THOLD_SNMP_CONTACT&#062 &#060THOLD_SNMP_SYSTEM&#062 &#060THOLD_LAST_FAIL&#062 &#060THOLD_AVAILABILITY&#062 &#060THOLD_TOT_POLL&#062 &#060THOLD_FAIL_POLL&#062 &#060THOLD_CUR_TIME&#062 &#060THOLD_AVG_TIME&#062 &#060THOLD_NOTES&#062

en	Alert/Warning Message Defaults

en	Threshold Alert Message

en	This is the message that will be displayed at the top of all Threshold Alerts (1024 Char MAX). HTML is allowed, but will be removed for text only Emails. There are several common replacement tags that may be used in include:<br>&#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060HOST_ID&#062 &#060SITE&#062 &#060LOCATION&#062 &#060TIME&#062 &#060DATE&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062 &#060URL&#062 &#060GRAPHID&#062 &#060THOLD_ID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#60NOTES&#62 &#060DNOTES&#062

en	An Alert has been issued that requires your attention. <br><br><strong>Device</strong>: <DESCRIPTION> (<HOSTNAME>)<br><strong>URL</strong>: <URL><br><strong>Message</strong>: <SUBJECT><br><br><GRAPH>

en	Threshold Warning Message

en	This is the message that will be displayed at the top of all Threshold warnings (1024 Char MAX). HTML is allowed, but will be removed for text only Emails. There are several common replacement tags that may be used in include:<br>&#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060HOST_ID&#062 &#060SITE&#062 &#060LOCATION&#062 &#060TIME&#062 &#060DATE&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062 &#060URL&#062 &#060GRAPHID&#062 &#060THOLD_ID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#60NOTES&#62 &#060DNOTES&#062

en	A Warning has been issued that requires your attention. <br><br><strong>Device</strong>: <DESCRIPTION> (<HOSTNAME>)<br><strong>URL</strong>: <URL><br><strong>Message</strong>: <SUBJECT><br><br><GRAPH>

en	Threshold Restoral Message

en	This is the message that will be displayed at the top of all Threshold restoral notifications (1024 Chars MAX). HTML is allowed, but will be removed for text only Emails. There are several common replacement tags that may be used in include:<br>&#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060HOST_ID&#062 &#060SITE&#062 &#060LOCATION&#062 &#060TIME&#062 &#060DATE&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062 &#060URL&#062 &#060GRAPHID&#062 &#060THOLD_ID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#60NOTES&#62 &#060DNOTES&#062

en	A Threshold has returned to normal status. <br><br><strong>Device</strong>: <DESCRIPTION> (<HOSTNAME>)<br><strong>URL</strong>: <URL><br><strong>Message</strong>: <SUBJECT><br><br><GRAPH>

en	Thold

en	Duplicate

en	Associate

en	Disassociate

en	Devices

en	Click 'Continue' to Delete Notification Lists(s). Any Device(s) or Threshold(s) associated with the List(s) will be reverted to the default.

en	Cancel

en	Continue

en	Delete Notification List(s)

en	Click 'Continue' to Duplicate the following Notification List(s).

en	New List Name

en	New Notification List

en	Duplicate Notification List(s)

en	%s Threshold Template(s)

en	Click 'Continue' to Association the Notification List '%s' with the Threshold Template(s) below.

en	No Change

en	Notification List Only

en	Notification List, Retain Other Settings

en	Warning Membership:

en	Alert Membership:

en	Associate Notification List(s)

en	Click 'Continue' to Disassociate the Notification List '%s' from the Thresholds Template(s) below.

en	Remove List

en	Disassociate Notification List(s)

en	%s Threshold(s)

en	Click 'Continue' to Associate the Notification List '%s' with the Threshold(s) below.

en	Click 'Continue' to Disassociate the Notification List '%s' from the Thresholds(s) below.

en	Click 'Continue' to Associate the Notification List '%s' with the Device(s) below.

en	You may also Associate the Devices Thresholds as well. However, these Device Thresholds will allow the Threshold Notification List to be overwritten.

en	Notification and Global Lists

en	Resulting Membership:

en	Device Threshold Warning Membership:

en	Device Threshold Alert Membership:

en	Click 'Continue' to Disassociate the Notification List '%s' from the Device(s) below.

en	You may also Disassociate the Devices Thresholds as well. However, these Device Thresholds will allow the Threshold Notification List to be overwritten.

en	[edit: %s]

en	[new]

en	List General Settings

en	Name

en	Enter a name for this Notification List.

en	Description

en	Enter a description for this Notification List.

en	To disable all notifications from this Notification List, you can simply disable it here.

en	To Email Addresses

en	Enter a comma separated list of Email addresses for this Notification List.

en	BCC Email Addresses

en	Enter a comma separated list of Email addresses for this Notification List to be blind copied.

en	Email Style/Format File

en	Choose the custom html wrapper and CSS file to use. This file contains both html and CSS to wrap around your report. If it contains more than simply CSS, you need to place a special <REPORT> tag inside of the file. This format tag will be replaced by the report content. These files are located in the 'formats' directory.

en	Associated Devices

en	Search

en	Site

en	None

en	Device Template

en	Default

en	Associated

en	Go

en	Set/Refresh Filters

en	Clear

en	Clear Filters

en	ID

en	Status

en	Associated Lists

en	Graphs

en	Data Sources

en	Hostname

en	Current List Only

en	Current and Global List(s)

en	No Associated Devices Found

en	Associated Thresholds

en	Template

en	State

en	All

en	Warning Lists

en	Alert Lists

en	Type

en	Templated

en	No

en	Yes

en	baseline-LOW

en	baseline-HIGH

en	Select Users

en	Specific Emails

en	Current List

en	Unknown Threshold

en	Log Only

en	Editable

en	Read Only

en	No Thresholds Found

en	Associated Templates

en	Rows

en	Unknown Template

en	No Threshold Templates

en	Lists

en	List Name

en	Emails

en	No Notification Lists

en	Notification has been Suspended. Press the Resume button to resume it

en	Notification has been Resumed. Press the Suspend button to suspend it

en	Pending Notifications have been removed from the database. Previously sent notification not purged will remain until they age out.

en	Click 'Continue' to delete the following Notification.

en	Click 'Continue' to delete all following Notifications.

en	Delete Notification

en	Delete Notifications

en	Event Notifications [ Notifications Suspended by User: %s, %s ago ]

en	Event Notifications

en	Topic

en	Processed

en	Suspend

en	Suspend Notification Processing

en	Resume

en	Resume Notification Processing

en	Purge

en	Purge Notification Queue

en	Notifications

en	The supported notification topic.

en	Event Description

en	The name of the object as defined by the caller.

en	The hostname that was the source of this event.

en	The Notification List used if any.

en	Object ID

en	The Object ID defined by the caller. Generally its unique 'id'.

en	Event Time

en	The time of the event as defined by the caller.

en	Has the Notification Event been processed.

en	Errors

en	Did this notification result in an error. Hover on the error column for details.

en	Run Time

en	The time in seconds it took to process the event.

en	Not Specified

en	Done

en	Pending

en	Errored

en	Success

en	No Notifications

en	Off

en	On

en	Toggle Threshold VRULES %s

en	Create Threshold

en	Alert Hi for %s (%s)

en	Alert Low for %s (%s)

en	Warning Hi for %s (%s)

en	Warning Low for %s (%s)

en	Alert Hi for %s (%s %%%)

en	Alert Low for %s (%s %%%)

en	Warning Hi for %s (%s %%%)

en	Warning Low for %s (%s %%%)

en	Threshold Alert/Warning Values

en	Click 'Continue' to apply all appropriate Thresholds to these Device(s).

en	Create Threshold from Data Source

en	Auto-create Thresholds

en	Created %s thresholds

en	No Threshold(s) Created. Either they already exist, or no suitable matches found.

en	No Threshold(s) Created. Threshold(s) Template not found.

en	The following Data Sources have no Threshold Templates associated with them

en	Click 'Continue' to create Thresholds for these Data Sources?

en	Available Threshold Templates

en	Select a Threshold Template

en	There are no Threshold Templates associated with the following Data Sources

en	Create Threshold from Template

en	The following Graphs have no Threshold Templates associated with them

en	Press 'Continue' if you wish to create Threshold(s) for these Graph(s)

en	There are no Threshold Templates associated with the following Graphs

en	Associated Threshold Templates

en	Threshold Exists

en	Threshold Does Not Exist

en	Delete Threshold Template Association

en	No Associated Threshold Templates.

en	Add Threshold Template

en	Add

en	Add Threshold Template to Device

en	Click 'Continue' to Delete the following Threshold Template will be disassociated from the Device.

en	Threshold Template Name: %s

en	Remove Threshold Template

en	Add Threshold Template to Device Template

en	Click 'Continue' to Delete the following Threshold Template will be disassociated from the Device Template.

en	Either No Templates or Threshold(s) Already Exists - No Thresholds were created.

en	You are not authorized to modify one or more of the Thresholds selected

en	Click 'Delete' to delete the following Threshold(s).

en	Delete Threshold(s)

en	Click 'Continue' to enable the following Threshold(s).

en	Enable Threshold(s)

en	Click 'Continue' to disable the following Threshold(s).

en	Disable Threshold(s)

en	Click 'Continue' to reapply Suggested Name(s) to the following Threshold(s).

en	Apply Suggestion

en	Click 'Continue' to update the following Threshold(s) with their associate Template's details.

en	Reapply Template

en	Click 'Continue' to Acknowledge the following Threshold(s). Thresholds that do not allows this, or that are not triggered, will be ignored.

en	Acknowledge Threshold(s)

en	Click 'Continue' to Resume Notifications for the following Threshold(s). Thresholds that do not allows this, or that are not triggered will be ignored.

en	Resume Notifications for Threshold(s)

en	Click 'Continue' to Suspend Notifications for the following Threshold(s). Thresholds that do not allows this, or that are not triggered will be ignored.

en	Suspend Notification for Threshold(s)

en	Invalid action detected, can not proceed

en	Threshold Management

en	Apply Filters

en	Return to Defaults

en	Data Template

en	Disabled at Template

en	Disabled at Threshold

en	Ack Required

en	External ID

en	The Threshold Type. For Baseline Types: [TIP] refers to the Time In the Past with MIN, MAX, AVG, and LAST from no more than a day in time from that period. [AOT] refers to the Average over the entire Time period. If there is a colon followed by MIN, MAX, AVG, LAST, the Value came from that Consolidation Function.

en	DSName

en	Current

en	The last measured value for the Data Source

en	High

en	The High Warning / Alert values. NOTE: Baseline values are a percent, all other values are display values that may be modified by a cdef.

en	Low

en	The Low Warning / Alert values. NOTE: Baseline values are a percent, all other values are display values that may be modified by a cdef.

en	Trigger

en	Duration

en	Repeat

en	In State

en	The amount of time that has passed since the Threshold either Breached or was Triggered

en	Acknowledgment required for this Threshold

en	No [Template:Thold]

en	No [Template]

en	No [Thold]

en	%d Triggers

en	No Thresholds

en	Threshold Deleted, can not Edit!

en	Graph Data

en	Edit Threshold Template

en	Data Source Description:

en	Associated Graph (Graphs using this RRD):

en	Last:

en	WHi:

en	WLo:

en	AHi:

en	ALo:

en	BL Up:

en	BL Down:

en	Unknown Template ID %d

en	Not Templated

en	Data Source Item [ %s ] - Current value: [ %s ]

en	Replacement Fields: %s

en	Data Sources: %s

en	Template/Enabled Information

en	Template Propagation Enabled

en	Whether or not these settings will be propagated from the Threshold template.

en	Template Name

en	Name of the Threshold Template the Threshold was created from.

en	Enabled at Template Level

en	A Threshold must be enabled both at the Template Level and the Threshold level to be checked.

en	Enabled at Threshold Level

en	General Settings

en	Name (Displayed)

en	Provide the Thresholds a meaningful name

en	Name (Format)

en	Warning HRULE Color

en	Please choose a Color for the Graph HRULE for the Warning Thresholds. Choose 'None' for No HRULE. Note: This features is supported for Data Manipulation types 'Exact Value' and 'Percentage' only at this time.

en	Alert HRULE Color

en	Please choose a Color for the Graph HRULE for the Alert Thresholds. Choose 'None' for No HRULE. Note: This features is supported for Data Manipulation types 'Exact Value' and 'Percentage' only at this time.

en	Graph Timespan

en	The Graph End time will be set at the time of triggering. The Graph Start time will be the End Time minus the Graph Timespan.

en	Skip Scaling on HRULEs

en	If Checked, the Scale on the Graph will not be impacted by either the Alert or Warning HRULEs.

en	Weekend Exemption

en	If this is checked, this Threshold will not alert on weekends.

en	Disable Restoration Email

en	If this is checked, Threshold will not send an alert when the Threshold has returned to normal status.

en	Acknowledgment Options

en	There are three Acknowledgment levels that control how you must respond to a Threshold breach condition. They are:<br><br><ul><li><i>None Required</i> - When you select this option, no Acknowledgment is required for a Threshold breach.</li><li><i>Suspendible Notification</i> - With this option, once you Acknowledge or Suspend Notifications on the Threshold, you will no longer receive notifications while it is breached. You may subsequently, Resume Notifications while its breached.</li><li><i>Persistent Acknowledgment</i> - With this option, even after the Threshold has returned to normal, you must Acknowledge the Threshold and provide an optional Operator Message.</li></ul>

en	None Required

en	Suspendible Notification

en	Persistent Acknowledgment

en	Threshold Type

en	The type of Threshold that will be monitored.

en	Re-Alert Cycle

en	Repeat alert after this amount of time has passed since the last alert.

en	Warning - High / Low Settings

en	Numeric values for High and Low Thresholds can include the following suffixes for numbers greater than 1 to 'K', 'M', 'G', 'T', 'P', 'E', 'Z', 'Y', and for numbers less than 1 'm', 'u', 'p', 'f'.

en	High Threshold

en	If set and Data Source value goes above this number, warning will be triggered. NOTE: This value must be a RAW number. The value displayed on the Graph may be modified by a cdef.

en	Low Threshold

en	If set and Data Source value goes below this number, warning will be triggered. NOTE: This value must be a RAW number. The value displayed on the Graph may be modified by a cdef.

en	Breach Duration

en	The amount of time the Data Source must be in breach of the Threshold for a warning to be raised. NOTE: This value must be a RAW number. The value displayed on the Graph may be modified by a cdef.

en	Alert - High / Low Settings

en	If set and Data Source value goes above this number, alert will be triggered. NOTE: This value must be a RAW number. The value displayed on the Graph may be modified by a cdef.

en	If set and Data Source value goes below this number, alert will be triggered. NOTE: This value must be a RAW number. The value displayed on the Graph may be modified by a cdef.

en	The amount of time the Data Source must be in breach of the Threshold for an alert to be raised.

en	Warning - Time Based Settings

en	Breach Count

en	The number of times the Data Source must be in breach of the Threshold.

en	Breach Window

en	The amount of time in the past to check for Threshold breaches.

en	Alert - Time Based Settings

en	Baseline Settings

en	The type of Baseline. [TIP] is the Time in Past, [AOT] is the Average over Time. Percentage Deviation is a percentage value from the historical value. Absolute Value is a deviation either above or below the Baseline over that historical value. For the [TIP] Baseline Types, the MIN, MAX, AVG, and LAST will come from no more than a one day time period at that point in time.

en	Consolidation Function

en	Average

en	Minimum

en	Maximum

en	Last

en	The Consolidation function to use for the Baseline Type value calculation.

en	Time Range

en	Specifies the point in the past (based on rrd resolution) that will be used as a reference or the duration to use for the Floating Average when using the Floating Average type Threshold

en	Deviation UP

en	Specifies allowed deviation for the upper bound Threshold. If not set, the upper bound Threshold will not be checked at all. The unit of measure is an absolute values for 'Absolute Value' Type, and a Percentable for both '%% Deviation' and '%% Floating Average'

en	Specifies allowed deviation for the upper bound Threshold. If not set, the upper bound Threshold will not be checked at all. The unit of measure is an absolute values for 'Absolute Value' Type, and a Percentable for both '%%% Deviation' and '%%% Floating Average'

en	Deviation DOWN

en	Specifies allowed deviation for the lower bound Threshold. If not set, the lower bound Threshold will not be checked at all. The unit of measure is an absolute values for 'Absolute Value' Type, and a Percentable for both '%% Deviation' and '%% Floating Average'

en	Specifies allowed deviation for the lower bound Threshold. If not set, the lower bound Threshold will not be checked at all. The unit of measure is an absolute values for 'Absolute Value' Type, and a Percentable for both '%%% Deviation' and '%%% Floating Average'

en	Trigger Count

en	Number of consecutive times the Data Source must be in breach of the baseline Threshold for an alert to be raised.<br>Leave empty to use default value (<b>Default: %s cycles</b>)

en	Data Manipulation

en	Data Type

en	Special formatting for the given data.

en	Threshold CDEF

en	Apply this CDEF before returning the data.

en	Percent Data Source

en	Second Data Source Item to use as total value to calculate percentage from.

en	Show Units

en	Display units for very large or small numbers.

en	Force Units Suffix

en	If you wish to display a forced unit suffix on the various Threshold pages and Notifications, enter it here. The size is limited to no more than 10 characters.

en	Decimal Digits to Display

en	The number of decimal digits to display for Threshold and Current Values. The default is auto or 2.

en	An RPN Expression is an RRDtool Compatible RPN Expression. Syntax includes all functions below in addition to both Device and Data Query replacement expressions such as <span class="deviceUp">|query_ifSpeed|</span>. To use a Data Source in the RPN Expression, you must use the syntax: <span class="deviceUp">|ds:dsname|</span>. For example, <span class="deviceUp">|ds:traffic_in|</span> will get the current value of the traffic_in Data Source for the RRDfile(s) associated with the Graph. Any Data Source for a Graph can be included.<br><br>Math Operators: <span class="deviceUp">+, -, /, *, &#37;, ^</span><br>Functions: <span class="deviceUp">SIN, COS, TAN, ATAN, SQRT, FLOOR, CEIL, DEG2RAD, RAD2DEG, ABS, EXP, LOG, ATAN, ADNAN</span><br>Flow Operators: <span class="deviceUp">UN, ISINF, IF, LT, LE, GT, GE, EQ, NE</span><br>Comparison Functions: <span class="deviceUp">MAX, MIN, INF, NEGINF, NAN, UNKN, COUNT, PREV</span>%s %s

en	Upper Data Source

en	Upper data source to calculate the total value.

en	Notification Settings

en	Alert Subject

en	This is the Email subject that will be displayed in the Email (128 Char MAX). Leave blank for the default. There are several common replacement tags that may be used in include:<br>&#060PHASE&#062 &#060THRESHOLDVALUE&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060BREACHUP&#062 &#060REALERT&#062 &#60HOSTNAME&#62

en	Alert Body

en	This is the message that will be displayed at the top of all Threshold Alerts (1024 Char MAX). HTML is allowed, but will be removed for text only emails. There are several common replacement tags that may be used in include:<br>eg. &#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060TIME&#062 &#060DATE&#062 &#060URL&#062 &#060GRAPHID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#060HI&#062 &#060LOW&#062 &#060DURATION&#062 &#060TRIGGER&#062 &#060DETAILS_URL&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062

en	Warning Subject

en	This is the Warning Email subject that will be displayed in the Email after change to Warning (128 Char MAX). Leave blank for the default. There are several common replacement tags that may be used in include:<br>&#060PHASE&#062 &#060THRESHOLDVALUE&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060BREACHUP&#062 &#060REALERT&#062 &#60HOSTNAME&#62

en	Warning Body

en	This is the message that will be displayed at the top of all Threshold Warnings (1024 Char MAX). HTML is allowed, but will be removed for text only emails. There are several common replacement tags that may be used in include:<br>eg. &#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060TIME&#062 &#060DATE&#062 &#060URL&#062 &#060GRAPHID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#060HI&#062 &#060LOW&#062 &#060DURATION&#062 &#060TRIGGER&#062 &#060DETAILS_URL&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062

en	Restoral Subject

en	This is the Email subject that will be displayed in the Email after a Restoral to Normal (128 Char MAX). Leave blank for the default. There are several common replacement tags that may be used in include:<br>&#060PHASE&#062 &#060THRESHOLDVALUE&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060BREACHUP&#062 &#060REALERT&#062 &#60HOSTNAME&#62

en	Restoral Email Body

en	This is the message that will be displayed at the top of all Threshold restoral notifications (1024 Chars MAX). HTML is allowed, but will be removed for text only Emails. There are several common replacement tags that may be used in include:<br>&#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060HOST_ID&#062 &#060TIME&#062 &#060DATE&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062 &#060URL&#062 &#060GRAPHID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#60NOTES&#62 &#060DNOTES&#062

en	Warning Notification List

en	You may specify choose a Notification List to receive Warnings for this Data Source

en	Alert Notification List

en	You may specify choose a Notification List to receive Alerts for this Data Source

en	Style/Format File

en	SNMP Notification - Event Category

en	To allow a NMS to categorize different SNMP notifications more easily please fill in the category SNMP notifications for this template should make use of. E.g.: "disk_usage", "link_utilization", "ping_test", "nokia_firewall_cpu_utilization" ...

en	SNMP Event Description

en	You can customize the event description being sent out to the SNMP notification receivers by using variable bindings. Standard Device (|host_*|), Data Query (|query_*|) substitution variables can be used as well as following varbinds:<br>&#060;THRESHOLDNAME&#062; &#060;HOSTNAME&#062; &#060;HOSTIP&#062; &#060;TEMPLATE_ID&#062; &#060;TEMPLATE_NAME&#062; &#060;THR_TYPE&#062; &#060;DS_NAME&#062; &#060;HI&#062; &#060;LOW&#062; &#060;EVENT_CATEGORY&#062; &#060;FAIL_COUNT&#062; &#060;FAIL_DURATION&#062;

en	SNMP Notification - Alert Event Severity

en	Severity to be used for alerts. (low impact -> critical impact)

en	Medium

en	SNMP Notification - Warning Event Severity

en	Severity to be used for warnings. (Low impact -> Critical impact).<br>Note: The severity of warnings has to be equal or lower than the severity being defined for alerts.

en	Notify accounts

en	This is a listing of accounts that will be notified when this Threshold is breached.

en	Alert Emails

en	You may specify here extra Emails to receive alerts for this data source (comma separated)

en	Warning Emails

en	You may specify here extra Emails to receive warnings for this data source (comma separated)

en	If checked, Threshold notification will be sent to your local syslog.

en	Priority/Level

en	This is the Priority Level that will be logged into your syslog messages.

en	Facility

en	This is the Facility that will be used for this Threshold.

en	Event Triggering (Shell Command)

en	High Trigger Command

en	If set, and if a High Threshold is breached, this command will be run. Please enter a valid command. In addition, there are several replacement tags available that can be used to pass information from the Threshold to the script. You can do this as arguments on the command line, or preferably, in the environment of the script. All replacement values will appear in the environment of the script prefixed with THOLD_. So, for example CURRENTVALUE will become THOLD_CURRENTVALUE, and so on. The variables include: &#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060TIME&#062 &#060DATE&#062 &#060URL&#062 &#060GRAPHID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#060HI&#062 &#060LOW&#062 &#060DURATION&#062 &#060TRIGGER&#062 &#060DETAILS_URL&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062. Finally, Host, Data Query and Data Input replacement can be made. For example, if you have a data input custom data called pending, to perform the replacement use |pending|. For Data Query, and Host replacement use Cacti conventions |query_xxxx|, and |host_xxxx| respectively.

en	Low Trigger Command

en	If set, and if a Low Threshold is breached, this command will be run. Please enter a valid command. In addition, there are several replacement tags available that can be used to pass information from the Threshold to the script. You can do this as arguments on the command line, or preferably, in the environment of the script. All replacement values will appear in the environment of the script prefixed with THOLD_. So, for example CURRENTVALUE will become THOLD_CURRENTVALUE, and so on. The variables include: &#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060TIME&#062 &#060DATE&#062 &#060URL&#062 &#060GRAPHID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#060HI&#062 &#060LOW&#062 &#060DURATION&#062 &#060TRIGGER&#062 &#060DETAILS_URL&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062. Finally, Host, Data Query and Data input replacement can be made. For example, if you have a data input custom data called pending, to perform the replacement use |pending|. For Data Query, and Host replacement use Cacti conventions |query_xxxx|, and |host_xxxx| respectively.

en	Norm Trigger Command

en	If set, when a thold falls back to a normal value, this command will be run. Please enter a valid command. In addition, there are several replacement tags available that can be used to pass information from the Threshold to the script. You can do this as arguments on the command line, or preferably, in the environment of the script. All replacement values will appear in the environment of the script prefixed with THOLD_. So, for example CURRENTVALUE will become THOLD_CURRENTVALUE, and so on. The variables include: &#060DESCRIPTION&#062 &#060HOSTNAME&#062 &#060TIME&#062 &#060DATE&#062 &#060URL&#062 &#060GRAPHID&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060SUBJECT&#062 &#060GRAPH&#062 &#060HI&#062 &#060LOW&#062 &#060DURATION&#062 &#060TRIGGER&#062 &#060DETAILS_URL&#062 &#060DATE_RFC822&#062 &#060BREACHED_ITEMS&#062. Finally, Host, Data Query and Data input replacement can be made. For example, if you have a data input custom data called pending, to perform the replacement use |pending|. For Data Query, and Host replacement use Cacti conventions |query_xxxx|, and |host_xxxx| respectively.

en	Other Settings

en	Enter an Eternal ID for this Threshold.

en	Operator Notes

en	Enter instructions here for an operator who may be receiving the Threshold message.

en	Select Users(s)

en	Users Selected

en	All Users Selected

en	< 1 Minute

en	Since Created

en	Log

en	Time:

en	User:

en	System:

en	Swaps:

en	Pages:

en	Only logging, maint device

en	Link to Graph in Cacti

en	<html><body>An alert has been issued that requires your attention.<br><br><b>Device</b>: <DESCRIPTION> (<HOSTNAME>)<br><b>URL</b>: <URL><br><b>Message</b>: <SUBJECT><br><br><GRAPH></body></html>

en	<html><body>A warning has been issued that requires your attention.<br><br><b>Device</b>: <DESCRIPTION> (<HOSTNAME>)<br><b>URL</b>: <URL><br><b>Message</b>: <SUBJECT><br><br><GRAPH></body></html>

en	<html><body>A Threshold has returned to normal status. <br><br><strong>Device</strong>: <DESCRIPTION> (<HOSTNAME>)<br><strong>URL</strong>: <URL><br><strong>Message</strong>: <SUBJECT><br><br><GRAPH></body></html>

en	%% Dev [TIP:%s]

en	%%% Dev [TIP:%s]

en	Abs Val [TIP:%s]

en	%%% Dev [AOT:%s]

en	Abs Val [AOT:%s]

en	The Device ID was not set while trying to create Graph and Threshold

en	The Threshold Template ID was not found while trying to create Graph and Threshold

en	The Threshold Template ID was not set while trying to create Graph and Threshold

en	The Graph Creation failed for Threshold Template

en	Threshold was Autocreated due to Device Template mapping

en	Permission Denied

en	Record Updated

en	Failed to find linked Graph Template Item '%d' on Threshold '%d'

en	Created Threshold: %s

en	You must specify either 'High Alert Threshold' or 'Low Alert Threshold' or both!

en	Impossible threshold: 'High Alert Threshold' smaller than the 'Low Alert Threshold'!

en	Impossible threshold: 'High Warning Threshold' smaller than the 'Low Warning Threshold'!

en	Impossible threshold: 'High Warning Threshold' larger than the 'High Alert Threshold'!

en	Impossible threshold: 'Low Alert Threshold' larger than the 'Low Warning Threshold'!

en	With baseline thresholds enabled.

en	Time reference in the past must be set to positive integer value!

en	You must specify either 'Baseline Deviation UP' or 'Baseline Deviation DOWN' or both!

en	Impossible threshold: 'High Alert Threshold' smaller than the 'Low Alert Threshold'

en	Impossible threshold: The Alert Trigger Count must be greater or eval to 1!

en	Impossible threshold: The Alert Trigger Count must be less than or equal to the Trigger Count or eval to 1!

en	Impossible threshold: The Warning Trigger Count must be greater or eval to 1!

en	Impossible threshold: The Warning Trigger Count must be less than or equal to the Trigger Count or eval to 1!

en	Impossible threshold: 'Low Warning Threshold' smaller than the 'Low Alert Threshold'!

en	Unknown Threshold Type!

en	No Thresholds Templates associated with the Device's Template.

en	Mailer Error: No <b>TO</b> address set!!<br>If using the <i>Test Mail</i> link, please set the <b>Alert Email</b> setting.

en	Acknowledge Threshold

en	Click 'Continue' to Acknowledge the following Threshold(s).

en	Threshold Template Subordinate Data Template Not Found!

en	Threshold Template Subordinate Data Source Not Found!

en	Threshold Template import columns do not match the database schema

en	Imported

en	Threshold Template '%s' %s!

en	Updated

en	Import

en	Threshold Template '%s' %s Failed!

en	Update

en	Errors encountered while attempting to import Threshold Template data.

en	Threshold Template Import data was not found to be XML data.

en	Threshold Template Import data was not correct while importing Threshold Template.

en	The Threshold has been Ascknowledged.

en	The Threshold will no longer generate Alerts, Notifications, or execute commands.

en	The Threshold will restart generating Alerts.

en	Threshold Status

en	Actions

en	Ack Detail

en	Edit Threshold

en	Disable Threshold

en	Enable Threshold

en	To enable the Threshold, enable the Template first

en	View Graph

en	View Threshold History

en	Suspend Notifications until the Threshold clears

en	Resume Notifications for this breached Threshold

en	Acknowledgement Message

en	Date

en	Comment Not Found

en	Ack History

en	No name set

en	Hover over icons for help

en	A description for the Device

en	A Cacti unique identifier for the Device

en	The number of Graphs for this Device

en	The number of Data Sources for this Device

en	The status for this Device as of the last time it was polled

en	The last time Cacti found an issue with this Device. It can be higher than the Uptime for the Device, if it was rebooted between Cacti polling cycles

en	Uptime

en	The official uptime of the Device as reported by SNMP

en	The official hostname for this Device

en	Current (ms)

en	The current response time for the Cacti Availability check

en	Average (ms)

en	The average response time for the Cacti Availability check

en	Availability

en	The overall Availability of this Device since the last counter reset in Cacti

en	Edit Device

en	View Graphs

en	No Devices

en	Not Up

en	No Export Rows Found.

en	Threshold Log for [ %s ]

en	Log Entries

en	Device

en	Time

en	Alert Value

en	Measured Value

en	No Threshold Logs Found

en	Entries

en	You are not authorised to modify one or more of the Thresholds selected

en	%s (%d Thresholds)

en	Click 'Continue' to export the following Threshold Template(s).

en	Export Template(s)

en	Click 'Continue' to delete the following Threshold Template(s).

en	Delete Template(s)

en	Click 'Continue' to Reapply Suggested Names to Thresholds of the following Threshold Template(s).

en	Reapply Suggested Names to Template(s)

en	Click 'Continue' to Enable the selected Template(s) and Threshold(s).

en	Enable Template(s)

en	Click 'Continue' to Disable the selected Template(s) and Threshold(s).

en	Disable Template(s)

en	Threshold Template Creation Wizard

en	Data Source

en	Please select a Data Template

en	Please select a Data Source

en	Please press 'Create' to create your Threshold Template

en	Create

en	The Threshold Template requested can not be found

en	Provide the Threshold Template a meaningful name.

en	Suggested Threshold Name

en	Provide the suggested name for a Threshold created using this Template. Standard Device (|host_*|), Data Query (|query_*|) and Input (|input_*|) substitution variables can be used as well as |graph_title| for the Graph Title.

en	Data Template that you are using. (This cannot be changed)

en	Data Field

en	Data Field that you are using. (This cannot be changed)

en	Whether or not this Threshold will be checked and alerted upon.

en	Repeat alert after this amount of time has pasted since the last alert.

en	Min Trigger Duration

en	The amount of time the Data Source must be in a breach condition for an alert to be raised.

en	The number of times the Data Source must be in breach condition prior to issuing a warning.

en	Time Period Length

en	The number of times the Data Source must be in breach condition prior to issuing an alert.

en	Baseline Monitoring

en	Specifies allowed deviation for the upper bound Threshold. If not set, upper bound Threshold will not be checked at all. The unit of measure is an absolute values for 'Absolute Value' Type, and a Percentable for both '%% Deviation' and '%% Floating Average'

en	Specifies allowed deviation for the upper bound Threshold. If not set, upper bound Threshold will not be checked at all. The unit of measure is an absolute values for 'Absolute Value' Type, and a Percentable for both '%%% Deviation' and '%%% Floating Average'

en	Specifies allowed deviation for the lower bound Threshold. If not set, lower bound Threshold will not be checked at all. The unit of measure is an absolute values for 'Absolute Value' Type, and a Percentable for both '%% Deviation' and '%% Floating Average'

en	Specifies allowed deviation for the lower bound Threshold. If not set, lower bound Threshold will not be checked at all. The unit of measure is an absolute values for 'Absolute Value' Type, and a Percentable for both '%%% Deviation' and '%%% Floating Average'

en	Number of consecutive times the Data Source must be in a breached condition for an alert to be raised.<br>Leave empty to use default value (Default: %s cycles

en	Percent Datasource

en	Second Datasource Item to use as total value to calculate percentage from.

en	An RPN Expression is an RRDtool Compatible RPN Expression. Syntax includes all functions below in addition to both Device and Data Query replacement expressions such as <span style="color:blue;">|query_ifSpeed|</span>. To use a Data Source in the RPN Expression, you must use the syntax: <span style="color:blue;">|ds:dsname|</span>. For example, <span style="color:blue;">|ds:traffic_in|</span> will get the current value of the traffic_in Data Source for the RRDfile(s) associated with the Graph. Any Data Source for a Graph can be included.<br>Math Operators: <span style="color:blue;">+, -, /, *, &#37;, ^</span><br>Functions: <span style="color:blue;">SIN, COS, TAN, ATAN, SQRT, FLOOR, CEIL, DEG2RAD, RAD2DEG, ABS, EXP, LOG, ATAN, ADNAN</span><br>Flow Operators: <span style="color:blue;">UN, ISINF, IF, LT, LE, GT, GE, EQ, NE</span><br>Comparison Functions: <span style="color:blue;">MAX, MIN, INF, NEGINF, NAN, UNKN, COUNT, PREV</span>%s %s

en	Upper data source to use to calculate the total value.

en	Alert Email Subject

en	Alert Email Body

en	This is the Warning subject that will be displayed in the Email (128 Char MAX). Leave blank for the default. There are several common replacement tags that may be used in include:<br>&#060PHASE&#062 &#060THRESHOLDVALUE&#062 &#060CURRENTVALUE&#062 &#060THRESHOLDNAME&#062 &#060DSNAME&#062 &#060BREACHUP&#062 &#060REALERT&#062 &#60HOSTNAME&#62

en	Restoral Body

en	Notification List Read Only

en	If checked, Threshold Notification Lists in the Template will overwrite those of the Threshold.

en	Severity to be used for alerts. (Low impact -> Critical impact)

en	This is a listing of accounts that will be notified when this Threshold is breached.<br><br><br><br>

en	You may specify here extra Emails to receive alerts for this Data Source (comma separated)

en	You may specify here extra Emails to receive warnings for this Data Source (comma separated)

en	Enter an Eternal ID for this Thold Template.

en	%d Months, %d Days, %d Hours, %d Minutes, %d Seconds (Average)

en	%d Months, %d Days, %d Hours, %d Minutes, %d Seconds

en	%d Days, %d Hours, %d Minutes, %d Seconds (Average)

en	%d Days, %d Hours, %d Minutes, %d Seconds

en	%d Hours, %d Minutes, %d Seconds (Average)

en	%d Hours, %d Minutes, %d Seconds

en	%d Minutes, %d Seconds (Average)

en	%d Minutes, %d Seconds

en	%d Seconds (Average)

en	%d Seconds

en	DS Name

en	The High Warning / Alert values. NOTE: Baseline values are a percent, all other values are RAW values not modified by a cdef.

en	The Low Warning / Alert values. NOTE: Baseline values are a percent, all other values are RAW values not modified by a cdef.

en	Import Template from Local File

en	If the XML file containing Threshold Template data is located on your local machine, select it here.

en	Import Template from Text

en	If you have the XML file containing Threshold Template data as text, you can paste it into this box to import it.

en	Import Results

en	Cacti has imported the following items:

en	Import Threshold Templates

en	The file is too big.

en	Incomplete file transfer.

en	No file uploaded.

en	Temporary folder missing.

en	Failed to write file to disk

en	File upload stopped by extension

en	Invalid file extension.

en	NOTE:

en	ERROR:

en	Threshold(s) Already Exists - No Thresholds Created

en	Threshold Creation Wizard [ Select a Threshold Type ]

en	Threshold Creation Wizard [ Enter Custom Data and press 'Create' to Create your Threshold and Graph ]

en	Threshold Creation Wizard [ Select Available Data Query Rows ]

en	Threshold Creation Wizard [ Select a Device ]

en	Threshold Creation Wizard [ Select a Graph Template ]

en	Threshold Creation Wizard [ Select a Threshold Template ]

en	Threshold Creation Wizard [ Press 'Create' to Create your Threshold ]

en	Threshold Creation Wizard [ Select a Data Source ]

en	Threshold Creation Wizard [ Select a Graph ]

en	Threshold Creation Criteria

en	Create Type

en	Select a Threshold Type to use for creating this Threshold.

en	Select a Threshold Type

en	Non Templated

en	Threshold Template

en	Select a Threshold Template that the Graph and Threshold will be based upon.

en	Graph Template

en	Select a Graph Template to use for the Graph to be created.

en	Select a Graph Template

en	Select a Device to use for the Threshold and Graph to be created.

en	Select a Device

en	Select and Available Item

en	Data Query Item

en	Select the applicable row from the Data Query for the Graph and Threshold.

en	Creation Notes

en	Important Note:

en	This Threshold will be Templated. When using the Threshold Template option, you will be prompted for a Threshold Template, Graph Template, Device and possibly Data Query Item information before receiving the 'Create' prompt at which time, if any overridable Graph or Data Source information is allowed at the Graph and Data Source Template level, you will be prompted for it. Then, by pressing the 'Create' button, both the Graph and Threshold will be created simultaneously.

en	Graph

en	Select the Graph for the Threshold.

en	Select a Graph

en	Select a Data Source for the Threshold.

en	Select a Data Source

en	This Threshold will NOT be Templated and will only work on existing Graphs. If you wish to both Create the Graph and the Threshold simultaneously, select Threshold Template from the drop down and continue until the 'Create' button appears.

en	This Threshold will NOT be Templated. You can select either By Graph where you will then select an existing Device, Graph and Data Source before creating your Threshold, or you can select Threshold Template which will allow you to create a Non Templated Threshold and corresponding Graph simultaneously

en	Selected Graph

en	Created graph: %s