en	Delete

en	Backup

en	Enable

en	Disable

en	SSH/Telnet

en	SSH

en	Telnet

en	SCP

en	SFTP

en	Inherit

en	Daily

en	Weekly

en	Monthly

en	%d Month

en	%d Months

en	%d Year

en	%d Years

en	Never

en	%d hour

en	%d hours

en	00:00 (12am)

en	01:00 (1am)

en	02:00 (2am)

en	03:00 (3am)

en	04:00 (4am)

en	05:00 (5am)

en	06:00 (6am)

en	07:00 (7am)

en	08:00 (8am)

en	09:00 (9am)

en	10:00 (12am)

en	11:00 (11am)

en	12:00 (12pm)

en	13:00 (1pm)

en	14:00 (2pm)

en	15:00 (3pm)

en	16:00 (4pm)

en	17:00 (5pm)

en	18:00 (6pm)

en	19:00 (7pm)

en	20:00 (8pm)

en	21:00 (9pm)

en	22:00 (10pm)

en	23:00 (11pm)

en	Name

en	Give this account a meaningful name that will be displayed.

en	Username

en	The username that will be used for authentication.

en	Password

en	The password used for authentication.

en	Enable Password

en	Your Enable Password, if required.

en	Enable Device

en	Uncheck this box to disabled this device from being backed up.

en	Description

en	Name of this device (will be used for config saving and SVN if no hostname is present in config).

en	IP Address

en	This is the IP Address used to communicate with the device.

en	Directory

en	This is the relative directory structure used to store the configs.

en	Schedule

en	How often to Backup this device.

en	Device Type

en	Choose the type of device that the router is.

en	Auto-Detect

en	Connection Type

en	This is the type of connection used to communicate with the device.

en	Authentication Account

en	Choose an account to use to Login to the router

en	None

en	Default timeout

en	Default time to wait in seconds for a response

en	Default sleep time

en	Default time to sleep in microseconds (1/1,000,000th of a second)

en	Assume elevated

en	Check this box to assume this device is always elevated

en	Name of this device type.

en	Username Prompt

en	This is the username prompt to match on login.

en	Password Prompt

en	This is the password prompt to match on login.

en	Configuration file

en	This is the standard location of the configuration file on the remote device.

en	Copy TFTP

en	This is the CLI text used to send the backup to tftp server.

en	Show Version

en	This is the CLI text used to display the current version.

en	Confirmation Prompt

en	This is the confirmation prompt to match before transmission.

en	Confirm

en	Is there a confirmation prompt for copying the config?

en	Force Confirm

en	Is there a force confirmation prompt for copying the config?

en	Check End in Config

en	Check end in config?

en	Any Key prompt

en	Text to match a 'Press Any Key To Continue' styled prompt

en	General Settings

en	Presentation Mode

en	Should Router Configs be presented on the Console or a Top Tab.

en	Console

en	Top Tab

en	Close without exit

en	If ticked, when closing down the device connection, no 'exit' command is issued

en	Debug Connection Buffer

en	Whether to log direct output of device connection

en	Assume all devices elevated

en	Whether to assume all devices are elevated

en	Download Hour

en	The hour of the day to perform the full downloads.

en	Retry Schedule

en	The time to wait before attempting to perform an additional download when scheduled download fails

en	Retention Period

en	The number of days to retain old backups.

en	Transfer Options

en	Default connection type

en	Default type of connection used to communicate with the device.

en	Separate By Device

en	Separate archived Configs into a folder per device

en	SCP Path

en	When using SCP, leaving this blank will use PHP's SCP module which does not always work

en	TFTP Server IP

en	Must be an IP pointing to your Cacti server.

en	TFTP Backup Directory Path

en	The path to where your Configs will be backed up, it must be the path that the local TFTP Server writes to.

en	Archive Directory Path

en	The path to where your Configs will be archived (moved from TFTP directory)

en	Email Options

en	From Address

en	Email address the nightly backup will be sent from.

en	From Name

en	Name the nightly backup will be sent from.

en	Email Address

en	A comma delimited list of Email addresses to send the nightly backup Email to.

en	Devices

en	Device Types

en	Authentication

en	Backups

en	Compare

en	Technical Support [ %s ]

en	(%s chars)

en	(Not Set)

en	NOTICE: Starting manual backup of %s devices

en	NOTICE: Starting automatic retry

en	NOTICE: Starting automatic backup

en	FATAL: TFTP Backup Path is not set or is not a directory

en	FATAL: TFTP Server is not set

en	DEBUG: Attempting download for %s

en	%s devices backed up successfully.

en	%s devices failed to backup.

en	%s devices disabled from backup.

en	Config Backups

en	Configuration Backups

en	- Forced

en	- Manual

en	- Simulated

en	- Scheduled

en	- Reattempt

en	: Partial

en	: FAILED

en	STATS:

en	ERROR: Backup Path is not set or is not a directory

en	STATS: Backup now running since %s

en	WARN: Backup already running since %s

en	ERROR: Failed to connect to Device '%s' using connection type: %s

en	ERROR: Failed to download '%s' to '%s' via '%s'

en	File '%s' failed to load

en	File '%s' was not found

en	Router Config for %s (%s)

en	Backup from %s

en	File: %s/%s

en	Click 'Continue' to delete the following account(s).

en	Cancel

en	Continue

en	Delete Device(s)

en	You must select at least one device.

en	Return

en	Account: [edit: %s]

en	Account: [new]

en	Accounts

en	Account Management

en	No Router Accounts Found

en	Router Backups

en	Any

en	Search

en	Default

en	Go

en	Set/Refresh Filters

en	Clear

en	Clear Filters

en	Hostname

en	Either an IP address, or hostname. If a hostname, it must be resolvable by either DNS, or from your hosts file.

en	ID

en	The internal database ID for this Device. Useful when performing automation or debugging.

en	Functions

en	Perform functions against this backup

en	The directory of the stored device backups

en	Backup Time

en	The last Backup time of the device

en	Last Change

en	The last Change time of the device

en	Changed By

en	The last person to change the configuration of the device

en	Filename

en	The filename of the stored device backups

en	View Config

en	No Router Backups Found

en	Router Backup Comparison

en	Diff Mode

en	Inline

en	Side by Side

en	Compare Output

en	There are no Changes

en	Error, you must have backups for each device.

en	Debug for %s (%s)<br><br>

en	DEBUG: Executing manual backup using '%s' with arguments '%s'

en	Router Backup started. Check the Date Backup column or the Cacti Log for completion status and timing

en	Click 'Continue' to Delete the following device(s).

en	Click 'Continue' to Enable the following device(s).

en	Enable Device(s)

en	Click 'Continue' to Disable the following device(s).

en	Disable Device(s)

en	You must select at least Router Device.

en	Router: [edit: %s]

en	Router: [new]

en	Router Device Management

en	Account

en	Actions

en	Enabled

en	Last Backup

en	The device type of the device

en	Connect Type

en	The connection type for this device

en	Configs

en	The number of configurations for this device

en	The IP address of this device

en	Next Backup

en	Date Backup

en	Next Attempt

en	Last Attempt

en	Date Change

en	Today

en	Yesterday

en	This Week

en	This Month

en	Within a Year

en	Long, Long Ago

en	No

en	Yes

en	Connect via SSH

en	Connect via Telnet

en	Trace Route

en	Router Debug Info

en	Backups (%s)

en	Current

en	No Router Devices Found

en	When you click 'Continue', the following device(s) will be deleted.

en	Query [edit: %s]

en	Query [new]

en	View Router Device Types

en	Type

en	User Prompt

en	Pass Prompt

en	Version

en	Confirm Prompt

en	Check End In Config

en	Edit Device Type

en	No Router Device Types Found

en	Router Configs

en	DEBUG: Executing '%s' with arguments '%s'

en	Utilities

en	Router Devices

en	(edit)

en	(actions)

en	View Debug

en	Router Accounts

en	Router Compare

en	RouterConfigs

en	Routers