en	Disabled

en	Low

en	Medium

en	High

en	Mission Critical

en	Unknown

en	Down

en	Recovering

en	Up

en	Triggered

en	Triggered (Muted/Acked)

en	Down (Muted/Acked)

en	No Availability Check

en	Warning Ping

en	Alert Ping

en	Extra Small

en	Small

en	Large

en	Extra Large

en	Zoom

en	All Monitored

en	Not Up

en	Not Up or Triggered

en	Not Up, Triggered or Breached

en	Default

en	List

en	Tiles

en	Tiles & Time

en	Tree

en	Site

en	Device Template

en	Full

en	10 Chars

en	20 Chars

en	30 Chars

en	40 Chars

en	50 Chars

en	75 Chars

en	100 Chars

en	New Dashboard

en	Dashboard

en	Enter the Dashboard Name and then press 'Save' to continue, else press 'Cancel'

en	Create New Dashboard

en	Monitored Devices

en	All Monitored Devices

en	Monitored Devices either Down or Recovering

en	Monitored Devices either Down, Recovering, or with Triggered Thresholds

en	Monitored Devices either Down, Recovering, or with Breached or Triggered Thresholds

en	Unknown monitoring status (%s)

en	, and All Criticalities

en	, and of Low Criticality or Higher

en	, and of Medium Criticality or Higher

en	, and of High Criticality or Higher

en	, and of Mission Critical Status

en	</div><div class="center monitorFooterTextBold">Remember to first select eligible Devices to be Monitored from the Devices page!</div></div></div>

en	[ Refresh Again in %d Seconds ]

en	Monitor Filter [ Last Refresh: %s ]

en	[ Showing only first 30 Devices ]

en	Unsaved

en	Layout

en	Status

en	View

en	Grouping

en	Refresh

en	Refresh the Device List

en	Save

en	Save Filter Settings

en	New

en	Save New Dashboard

en	Rename

en	Rename Dashboard

en	Delete

en	Delete Dashboard

en	%s Alert for downed Devices

en	%s Alerts for downed Devices

en	Search

en	Criticality

en	Size

en	Trim

en	All Trees

en	Non-Tree Devices

en	All Sites

en	Non-Site Devices

en	Sites

en	All Templates

en	Non-Templated Devices

en	Template

en	[ Filter Settings Saved ]

en	Cancel

en	Mute

en	Acknowledge

en	Un-Mute

en	Reset

en	Dashboard '%s' Removed.

en	Dashboard '%s' is not owned by you.

en	Dashboard '%s' has been Saved!

en	Dashboard '%s' could not be Saved!

en	Non-Site Device

en	Root Branch

en	Tree: %s

en	Branch: %s

en	Just Up

en	Edit Device

en	View Graphs

en	View Thresholds/Alerts

en	View Device Syslog Alerts

en	View Device Syslog Entries

en	Never

en	Unspecified

en	None

en	Device Status Information

en	Device:

en	Site:

en	Location:

en	Criticality:

en	Status:

en	Admin Note:

en	IP/Hostname:

en	Curr/Avg:

en	%d ms

en	Warn/Alert:

en	%0.2d ms

en	Last Fail:

en	Time In State:

en	Availability:

en	Agent Uptime:

en	N/A

en	Sys Description:

en	Contact:

en	Notes:

en	Hostname

en	Hostname of device

en	Description

en	Availability

en	Length in status

en	Averages

en	Warning

en	Last Fail

en	Admin

en	Notes

en	Devices

en	Description:

en	Hostname:

en	Cacti Monitor Plugin Ping Threshold Notification

en	The following report will identify Devices that have eclipsed their ping latency thresholds. You are receiving this report since you are subscribed to a Device associated with the Cacti system located at the following URL below.

en	Cacti Monitoring Site

en	You will receive notifications every %d minutes if the Device is above its threshold.

en	You will receive notifications every time the Device is above its threshold.

en	The following Devices have breached their Alert Notification Threshold.

en	Current Ping

en	The following Devices have breached their Warning Notification Threshold.

en	Any

en	Click 'Continue' to %s monitoring on these Device(s)

en	Click 'Continue' to Change the Monitoring settings for the following Device(s). Remember to check 'Update this Field' to indicate which columns to update.

en	Update this Field

en	Change Monitoring Options

en	Enable Monitoring

en	Disable Monitoring

en	Indefinitely

en	%d Month

en	%d Months

en	%d Year

en	Normal User

en	Monitor Settings

en	Alarm Sound

en	This is the sound file that will be played when a Device goes down.

en	Loop Alarm Sound

en	Play the above sound on a loop when a Device goes down.

en	Show Icon Legend

en	Check this to show an icon legend on the Monitor display

en	Show Uptime

en	Check this to show Uptime on the Monitor display

en	Zoom to Errors

en	Check this to zoom to errored items on the Monitor display

en	Zoom Background

en	Background Color for Zoomed Errors on the Monitor display

en	Zoom Fontsize

en	Monitor

en	Enable on new devices

en	Check this to automatically enable monitoring when creating new devices

en	Notification/Reboot Log Retention

en	Keep Notification and Reboot Logs for this number of days.

en	Refresh Interval

en	This is the time in seconds before the page refreshes. (1 - 300)

en	This is how monitor will Group Devices.

en	Default with permissions

en	This is how monitor will render Devices.

en	Tiles & Downtime

en	Notification Report Format

en	Format File to Use

en	Choose the custom html wrapper and CSS file to use. This file contains both html and CSS to wrap around your report. If it contains more than simply CSS, you need to place a special <REPORT> tag inside of the file. This format tag will be replaced by the report content. These files are located in the 'formats' directory.

en	Ping Threshold Notifications

en	Warning Latency Notification

en	If a Device has a Round Trip Ping Latency above the Warning Threshold and above the Criticality below, subscribing emails to the Device will receive an email notification. Select 'Disabled' to Disable. The Thold Plugin is required to enable this feature.

en	Alert Latency Notification

en	If a Device has a Round Trip Ping Latency above the Alert Threshold and above the Criticality below, subscribing emails to the Device will receive an email notification. Select 'Disabled' to Disable. The Thold Plugin is required to enable this feature.

en	How Often to Resend Emails

en	How often should emails notifications be sent to subscribers for these Devices if they are exceeding their latency thresholds

en	Every Occurrence

en	Every %d Minutes

en	Every Hour

en	Every %d Hours

en	Reboot Notifications

en	Send Reboot Notifications

en	Should Device Reboot Notifications be sent to users?

en	Include Threshold Alert Lists

en	Should Threshold Alert Lists also receive Notification

en	Subject

en	Enter a Reboot message subject for the Reboot Notification.

en	Cacti Device Reboot Notification

en	Email Body

en	Enter an Email body to include in the Reboot Notification message. Currently, the only supported replacement tag accepted is <DETAILS>

en	<h1>Monitor Reboot Notification</h1><p>The following Device's were Rebooted. See details below for additional information.</p><br><DETAILS>

en	Notification Email Addresses

en	From Name

en	Enter the Email Name to send the notifications from

en	From Address

en	Enter the Email Address to send the notification from

en	Notification List

en	Select a Notification List below. All Emails subscribed to the notification list will be notified.

en	Email Addresses

en	Enter a comma delimited list of Email addresses to inform of a reboot event.

en	Do not Change

en	%d Percent Above Average

en	Device Monitoring Settings

en	Monitor Device

en	Check this box to monitor this Device on the Monitor Tab.

en	Device Criticality

en	What is the Criticality of this Device.

en	Ping Warning Threshold

en	If the round-trip latency via any of the predefined Cacti ping methods raises above this threshold, log a warning or send email based upon the Devices Criticality and Monitor setting. The unit is in milliseconds. Setting to 0 disables. The Thold Plugin is required to leverage this functionality.

en	milliseconds

en	Ping Alert Threshold

en	If the round-trip latency via any of the predefined Cacti ping methods raises above this threshold, log an alert or send an email based upon the Devices Criticality and Monitor setting. The unit is in milliseconds. Setting to 0 disables. The Thold Plugin is required to leverage this functionality.

en	Re-Baseline Warning

en	The percentage above the current average ping time to consider a Warning Threshold. If updated, this will automatically adjust the Ping Warning Threshold.

en	Re-Baseline Alert

en	The percentage above the current average ping time to consider a Alert Threshold. If updated, this will automatically adjust the Ping Alert Threshold.

en	Down Device Message

en	This is the message that will be displayed when this Device is reported as down.

en	Monitoring