en	Queue Trees
lv	Rindas koki

en	Interfaces
lv	Saskarnes

en	Wireless Registrations
lv	Bezvadu reģistrācijas

en	Interface Stats
lv	Saskarnes statistika

en	Since Reset
lv	Kopš atiestatīšanas

en	No Interfaces Found

en	Queue Status
lv	Rindas statuss

en	Qs In

en	Qs Out

en	Drps In

en	Drps Out

en	No Simple Queues Found

en	Queue Tree Status
lv	Rindas koka statuss

en	No Queue Trees Found

en	Tx CQQ

en	N/A

en	View Simple Queue
lv	Skatīt vienkāršo rindu

en	View Queue Trees
lv	Skatīt rindas kokus

en	View Interfaces

en	Please Select Data Query First from Console -> Settings -> Host MIB First

en	Graphs skipped or not created yet

en	Please select Data Query first from Console->Settings->Host MIB First

en	Custom Graph List Applied - Filtering from List

en	Wireless Registration Stats
lv	Bezvadu reģistrācijas statistika

en	Signal to Noise

en	No Wireless Registrations Found
lv	Nav atrasta neviena bezvadu reģistrācija

en	DHCP Registrations

en	Expired

en	Timeout

en	No Address List Entries Found

en	Click 'Continue' to Delete the following Users(s) and their Graph(s).
lv	Noklikšķiniet 'Turpināt', lai dzēstu šādus lietotājus un to grafiku(-us).

en	Inactive

en	MikroTik Poller Enabled

en	Check this box, if you want MikroTik polling to be enabled. Otherwise, the poller will not function.

en	MikroTik API Polling Enabled

en	Check this box, if you want Cacti to poll various settings using the MikroTik API. If for some reason you don't have access to the MikroTik API, uncheck this option.

en	Automatically Discover Cacti Devices

en	Do you wish to automatically scan for and add devices which support the MikroTik MIB from the Cacti host table?

en	Automatically Purge Devices

en	Do you wish to automatically purge devices that are removed from the Cacti system?

en	Maximum Concurrent Collectors

en	What is the maximum number of concurrent collector process that you want to run at one time?

en	Auto Discovery Settings

en	DHCP/DNS/List Settings

en	DHCP Retention

en	How long would you like to retain DHCP IP registration history?

en	DNS Retention

en	How long would you like to retain DNS Cache history?

en	Address List Retention

en	How long would you like to retain Address List history?

en	Device Graph Automation
lv	Ierīces grafika automatizācija

en	Exclude Users RegEx

en	User names that match this regex will not be graphed automatically

en	Exclude Users Time to Live

en	How long should an excluded user's data be preserved after they have disconnected.

en	MikroTik Device Collection Frequencies
lv	MikroTik ierīču apkopojuma atjaunošanas biežums

en	How often do you want to scan Storage Statistics?

en	Interfaces Frequency

en	How often do you want to scan the Interfaces?

en	How often do you want to scan the DNS/DHCP/Address Lists?

en	MikroTik Queue/Tree Collection Frequencies

en	Simple Queue/PPPoe Frequency

en	How often do you want to scan Simple Queue Statistics? Select Disabled to remove this feature.

en	Queue Trees Frequency
lv	Rindas koku biežums

en	How often do you want to scan the Queue Trees? Select Disabled to remove this feature.

en	MikroTik Wireless Collection Frequencies
lv	MikroTik bezvadu savākšanas frekvences

en	Wireless Registrations Frequency
lv	Bezvadu reģistrāciju atjaunošanas biežums

en	How often do you want to scan the Wireless Registrations? Select Disabled to remove this feature.
lv	Cik bieži jūs vēlaties skenēt bezvadu reģistrāciju? Atlasiet Atspējots, lai izslēgtu šo funkciju.

en	Indefinite

en	Simple Queues

en	Graphs Skipped by Rule, or Not Created

en	Ok if Cacti can connect to the MikroTik over its API port.

en	Connection Failed