en	Present

en	Unknown

en	Running

en	Warning

en	Testing

en	Down

en	Devices

en	Users

en	Queues

en	Queue Trees

en	Interfaces

en	DHCP

en	DNS Cache

en	Address Lists

en	Wireless Aps

en	Wireless Registrations

en	Graphs

en	Interface Stats

en	Search

en	Device

en	All

en	Default

en	Active

en	Since Reset

en	Go

en	Clear

en	Actions

en	Hostname

en	Name

en	Rx Bytes

en	Tx Bytes

en	Rx Packets

en	Tx Packets

en	Rx Errors

en	Tx Errors

en	Last Seen

en	Edit Device

en	No Interfaces Found

en	Queue Status

en	Src Addr/Mask

en	Dst Addr/Mask

en	Bytes In

en	Bytes Out

en	Pkts In

en	Pkts Out

en	Qs In

en	Qs Out

en	Drps In

en	Drps Out

en	No Simple Queues Found

en	Queue Tree Status

en	Trees

en	Flow

en	Cur Bytes

en	Cur Packets

en	Total Bytes

en	Total Packets

en	No Queue Trees Found

en	Wireless Aps Status

en	Aps

en	SSID

en	BSSID

en	Tx Rate

en	Rx Rate

en	Clients

en	Auth Clients

en	Frequency

en	Band

en	Noise Floor

en	Tx CQQ

en	User Statistics

en	Type

en	Hotspot

en	PPPoe

en	Active Users

en	User

en	IP Address

en	MAC

en	Connect Time

en	Cur In

en	Cur Out

en	Avg In

en	Avg Out

en	Total In

en	Total Out

en	N/A

en	No Users Found

en	Device Filter (Latest MikroTik Version is: %s)

en	Device Filter (Latest MikroTik Version is: %s, Released: %s)

en	ChangeLog

en	Status

en	Recovering

en	Up

en	Disabled

en	Description

en	FW Ver

en	Lic Ver

en	Uptime(d:h:m)

en	CPU %

en	CPUs

en	Processes

en	Total Mem

en	Used Mem

en	Total Disk

en	Used Disk

en	View Users

en	View Simple Queue

en	View Queue Trees

en	View Wireless Aps

en	No Wireless Aps Found

en	View Interfaces

en	View Graphs

en	No Graphs Defined

en	No Devices Found

en	Please Select Data Query First from Console -> Settings -> Host MIB First

en	Graphs skipped or not created yet

en	Please select Data Query first from Console->Settings->Host MIB First

en	Custom Graph List Applied - Filtering from List

en	Graph Preview Filters

en	Wireless Registration Stats

en	Registrations

en	Client Name

en	MAC Address

en	Signal to Noise

en	No Wireless Registrations Found

en	DHCP Registrations

en	Entries

en	Expires in

en	Blocked

en	Last Updated

en	%s Seconds

en	Dynamic

en	Static

en	No DHCP Entries Found

en	Permanent

en	Expired

en	Export

en	Data

en	TTL

en	No DNS Entries Found

en	List

en	Address

en	Timeout

en	No Address List Entries Found

en	Delete

en	Click 'Continue' to Delete the following Users(s) and their Graph(s).

en	Cancel

en	Continue

en	Delete Device(s)

en	You must select at least one User.

en	Return

en	MikroTik Users

en	Inactive

en	Set/Refresh Filters

en	Clear Filters

en	User Name

en	Domain

en	MikroTik Viewer

en	MikroTik Admin

en	MikroTik

en	MikroTik General Settings

en	MikroTik Poller Enabled

en	Check this box, if you want MikroTik polling to be enabled. Otherwise, the poller will not function.

en	MikroTik API Polling Enabled

en	Check this box, if you want Cacti to poll various settings using the MikroTik API. If for some reason you don't have access to the MikroTik API, uncheck this option.

en	Automatically Discover Cacti Devices

en	Do you wish to automatically scan for and add devices which support the MikroTik MIB from the Cacti host table?

en	Automatically Purge Devices

en	Do you wish to automatically purge devices that are removed from the Cacti system?

en	Maximum Concurrent Collectors

en	What is the maximum number of concurrent collector process that you want to run at one time?

en	%d Process

en	%d Processes

en	Auto Discovery Settings

en	Auto Discovery Frequency

en	How often do you want to look for new Cacti Devices?

en	DHCP/DNS/List Settings

en	DHCP Retention

en	How long would you like to retain DHCP IP registration history?

en	DNS Retention

en	How long would you like to retain DNS Cache history?

en	Address List Retention

en	How long would you like to retain Address List history?

en	Device Graph Automation

en	Automatically Add New Graphs

en	How often do you want to check for new objects to graph?

en	Never

en	%d Minutes

en	%d Hour

en	%d Hours

en	%d Day

en	%d Days

en	Exclude Users RegEx

en	User names that match this regex will not be graphed automatically

en	Exclude Users Time to Live

en	How long should an excluded user's data be preserved after they have disconnected.

en	MikroTik Device Collection Frequencies

en	Storage Frequency

en	How often do you want to scan Storage Statistics?

en	Processor Frequency

en	How often do you want to scan Device Processor Statistics?

en	Interfaces Frequency

en	How often do you want to scan the Interfaces?

en	DNS/DHCP/List Frequency

en	How often do you want to scan the DNS/DHCP/Address Lists?

en	MikroTik Queue/Tree Collection Frequencies

en	Simple Queue/PPPoe Frequency

en	How often do you want to scan Simple Queue Statistics? Select Disabled to remove this feature.

en	Queue Trees Frequency

en	How often do you want to scan the Queue Trees? Select Disabled to remove this feature.

en	MikroTik Wireless Collection Frequencies

en	Wireless HotSpot Users Frequency

en	How often do you want to scan Wireless User Statistics? Select Disabled to remove this feature.

en	Wireless Access Point Frequency

en	How often do you want to scan the Wireless Access Points? Select Disabled to remove this feature.

en	Wireless Registrations Frequency

en	How often do you want to scan the Wireless Registrations? Select Disabled to remove this feature.

en	Wireless Stations Frequency

en	How often do you want to scan the Wireless Stations? Select Disabled to remove this feature.

en	Management

en	Normal User

en	General Administration

en	%d Minute

en	Indefinite

en	%d Week

en	%d Weeks

en	%d Months

en	%d Year

en	Simple Queues

en	Storage

en	(edit)

en	Graphs Skipped by Rule, or Not Created

en	MikroTik Credentials

en	Read Only User

en	Provide a read only username for the MikroTik.

en	Password

en	Provide the read only username password for this MikroTik.

en	Connection Result

en	Ok if Cacti can connect to the MikroTik over its API port.

en	Connection Failed