en	Intropage - Permission Denied

en	One or more panels was removed due to insufficient permissions. Contact administrator.

en	You can disable rows above in Configure > Settings > General > Hide Cacti Dashboard and use the whole page for Intropage

en	Default

en	Hide red/yellow/green square notifications

en	Disable panel move/enable copy text from panel

en	Actions ...

en	Add New Dashboard

en	Remove current dashboard

en	Number of lines - %d

en	Refresh Now

en	Refresh Disabled

en	Refresh by Poller

en	Refresh Every 1 Minute

en	Refresh Every 5 Minutes

en	Refresh Every Hour

en	Important period - disabled

en	Important period - 15 minutes

en	Important period - 1 hour

en	Important period - 4 hours

en	Important period - 1 day

en	Sort by Severity

en	Sort by User Preference

en	Reload Panel Definitions

en	Set Intropage as Default Login Page

en	Set graph as Default Login Page

en	Display Intropage in Console

en	Display Intropage in Tab as Default Page

en	Less panels on a line

en	More panels on a line

en	Cancel sharing

en	Share this dashboard

en	Share empty dashboard not allowed

en	Use shared dashboard

en	Cannot use shared dashboard - dashboard limit reached.

en	No shared dashboards

en	Welcome to Intropage!

en	You can Add Dashboard Panels in more ways:

en	Select prepared panels from the "Panels menu". Panel can be grayed out. It is due to permissions, ask administrator

en	Add any Cacti Graph, use icon

en	You can create own panels. More info in file <cacti_install_dir>/plugins/intropage/panellib/README.md

en	You can share dashboards to other users:

en	use "Share this dashboard" option in Actions menu - Every user can use it as template.

en	You can use shared dashboard using the Actions menu:

en	Use "Use shared dashboard (user/dashboard name) - It prepares the same dashboard like shared but with your permissions.

en	Customization:

en	You can create up to 9 dashboards. Every dashboard can be named, use icon

en	Intopage can be displayed in console or in separated tab. You can change it in Action menu

en	If you want to copy text from panel, you have to disable drag and drop function, use icon

en	Panel Details

en	Disable panel move/Enable copy text from panel

en	Enable panel move/Disable copy text from panel

en	Show red/yellow/green square notifications

en	Error reading new data

en	Close

en	Dashboard has been removed

en	New Dashboard

en	Dashboard has been added

en	Cannot add zoomed or custom timespaned graph, changing timespan to Last half hour

en	Intropage Panel Library Refreshed from Panel Library

en	Dashboard has been added, please wait few poller cycle for data

en	Error - trying share non-shared dashboard

en	The Panel includes a render function but it does not exist.

en	The Panel does not have a render function.

en	Not Found

en	Panel not found

en	Details Function does not exist.

en	Panel Not Found

en	[ Updates in %s ]

en	%s Sec

en	%s Seconds

en	%s Min

en	%s Minutes

en	%s Hours

en	%s Hrs

en	%s Days

en	No Data Present. Either Force Update, or wait for next Cacti Polling cycle.

en	No Data Present. This Panel does not allow for Forced Updates. You will have to wait until the Cacti's Poller to perform the check.

en	Disable panel

en	Reload Panel

en	Show Details

en	Loading data ...

en	No Data Found. Either wait for next check, or use the Force Reload if available.

en	Panels ...

en	%s (no permission)

en	Cannot add to Dashboard. Custom timespan.

en	Remove from Dashboard

en	Add to Dashboard

en	Dashboard Names

en	Dashboard %s

en	User Level Panel Update Frequencies

en	System Panel Update Frequencies (All Authorized Users)

en	Trend Update Frequencies

en	Intropage

en	Normal User

en	[edit: %s]

en	System Level Panels

en	Panels that are appropriate for administrative or power users to access and not typically applicable for general users. Panels are generally about overall system utilization.

en	User Level Panels

en	Panels that are appropriate for general users to access. Permissions are limited to what the current user can view.

en	You can Allow/Disallow Panels for User

en	Red Status

en	Yellow Status

en	Green Status

en	Display Settings

en	Important things will be at the top

en	If checked Intropage displays important (errors, warnings) information first

en	Display more panels on a line

en	For wide screen

en	Automatically Uninstall Panels

en	If a Panel is installed and required plugin is removed, automatically uninstall the panel too

en	Automatic Page Refresh

en	How often

en	Automatically by poller

en	Never

en	Every Minute

en	Every %d Minutes

en	Every Hour

en	Important period

en	From now to past. Affects row coloring, older events will not be highlighted, only displayed

en	Disabled

en	15 minutes

en	1 hour

en	4 hours

en	1 day

en	Number of panel lines

en	How many lines in panel

en	%d lines

en	Trend Timespan

en	For Trend charts, what should be the default timespan for those charts.

en	Poller Timeout

en	The amount of time, in minutes, that the Intropage background poller can run before being interrupted and killed by Cacti.

en	%d Minute

en	%d Minutes

en	%d Hour

en	Analyze Log - number of lines

en	How many lines of log will be analysed. Lines = in panel, 2x lines = in detail. Big number may causes slow page load

en	How often analyze DB

en	Poller runs this task. It could cause long poller run.

en	Every Day

en	Every Week

en	Every Month

en	Analyze DB - Level of db check

en	Quick - No Check rows for incorrect linksFast - check only not properly closed tablesChanged - check tables changed from last checkMedium - with rows scanExtended - full rows and keysMedium and extended may cause a slow page load!

en	Quick

en	Fast

en	Changed

en	Medium

en	Extended

en	NTP Time Check - IP or DNS name of NTP server

en	Insert IP or DNS name of NTP server

en	How often check NTP

en	DNS Check - Any DNS name

en	Insert DNS name for test

en	How often check DNS

en	Admin Information Panel about Maintenance Tasks, Down Devices, ..

en	If isn't empty, Panel will be displayed on the top. You can use html tags (b, i, ...).

en	Upcoming Maint Schedule warning days

en	How many days before a scheduled maintenance schedule should a warning be displayed?

en	Never warn

en	When maintenance starts

en	%d Day Before

en	%d Days Before

en	Network stats in

en	bytes or bits

en	Bytes

en	Bits

en	Alarm Settings

en	Alarm DB check Aborted Clients

en	If this event has occurred, trigger the selected Normal, Warning, or Alert status color.

en	Alarm Host with the same Description

en	Alarm Orphaned Data Source

en	Alarm non-empty Poller Output

en	Alarm Bad indexes Data Source

en	Alarm Threshold logonly action

en	Alarm when device bulk_walk_size is not optimized

en	Alarm Devices with the same IP/port

en	Alarm Device in more than one Tree

en	Alarm Device without a Tree

en	Alarm Device with Default public/private SNMP Community

en	Alarm Device without Monitoring

en	Alarm Device without Graph

en	Alarm Red/Yellow Polling Time

en	Polling times above these thresholds will trigger a Warning or Alert status color.

en	5s / 10s Yellow / Red

en	10s / 20s Yellow / Red

en	20s / 40s Yellow / Red

en	Alarm Red/Yellow Failed/All Ratio

en	The ratio of failed availability checks to successful checks to trigger as Warning or Alert status color.

en	0.1 / 0.2 Yellow / Red

en	0.2 / 0.4 Yellow / Red

en	0.5 / 0.5++ Yellow / Red

en	Alarm Red/Yellow Ping

en	Ping latency above these levels will trigger a Warning or Alert status color.

en	10ms / 20ms Yellow / Red

en	20ms / 50ms Yellow / Red

en	100ms / 200+ms Yellow / Red

en	Alarm Red/Yellow Worst Availability

en	Availability below these levels will trigger either a Yellow or a Red status color.

en	Yellow / Red

en	Alerts

en	Panels that provide alerting.

en	Host alerts

en	Host alerts (up/down/recovering) in last 30 minutes

en	Date

en	Host

en	State

en	More records, use detail window

en	Waiting for data

en	You don't have permissions to any hosts

en	Analysis Panels

en	Panels that analyze the current behavior of Cacti and it's plugins.

en	Analyze Logins

en	Analyze the last several Cacti logins for trends and errors.

en	Analyze Logs

en	Look for common errors in Cacti's log file that should be a cause for concern.

en	Database Checks

en	Analyze MySQL/MariaDB database for common errors. Note that this process may take a long time on very large systems.

en	Analyze Cacti Objects

en	Analyze Trees, Graphs, Hosts, ...

en	Analyze DS stats

en	Analyze data source stats

en	Username

en	IP Address

en	Status

en	Failed

en	Success - Login

en	Success - Token

en	Total Failed Logins: %s

en	None

en	Active Users in Last Hour:

en	Log file not accessible or empty

en	Analyze last %s log lines:

en	Errors:

en	Warnings:

en	Log Size: Larger than 2GB

en	Log Size: OK

en	Log Size: Quite Large

en	Log Size:

en	Last log lines:

en	Skipping DB tables checks. Database too large

en	Table %s status %s

en	DB: Problems

en	DB: OK

en	Max connection reached: %s / %s

en	You can increase Max connection via command line tools or permanently in config file

en	Connection errors: %s - try to restart SQL service, check SQL log, ...

en	Aborted clients/connects: %s

en	Aborted clients/connects - Run 'SET GLOBAL log_warnings = 1;' or ' log_error_verbosity = 1;' (depends on your MySQL/MariaDB version) from the mysql CLI and set in server.cnf to silence.

en	Connection errors: %s

en	Damaged tables: %s

en	You should run check and repair table commands

en	Memory tables: %s

en	All tables: %s

en	N/A

en	Devices with the same IP and port: %s

en	Not optimized Bulk Walk Size devices: %s

en	Please have a look to device parameter "Bulk Walk Maximum Repetitions". You can improve your poller performance

en	Reindex last run

en	RRD Checker last run

en	RRD Cleaner last run

en	%s: %s

en	It is recommended to run this tool at least occasionally

en	%s: not run yet

en	Orphaned Data Sources: %s

en	Datasource - bad indexes: %s

en	Thold logonly alert/warning: %s

en	Devices with the same description: %s

en	Devices in more than one tree: %s

en	Devices without graphs: %s

en	Devices without tree: %s

en	Devices with default public/private community: %s

en	Plugin Monitor - Unmonitored hosts: %s

en	Found %s problems

en	Everything OK

en	DS stats:

en	Panel needs DS stats enabled.

en	DS all records

en	DS null records

en	Analyze Cacti Log Details [ Warnings/Errors ]

en	Errors

en	Warnings

en	WARNING: File is Larger than 2GB

en	Log Size

en	Analyze Logins Detail

en	User

en	Result

en	Active Users in Last 2 Hours:

en	No Active Users

en	View Full User Log

en	Analyze Tree, Graphs, Hosts

en	Devices with the same IP and port - %s

en	Not optimized Bulk Walk Size devices - %s

en	Data maintenance

en	Orphaned Data Sources - %s

en	Datasources with bad indexes - %s

en	Thold logonly alert/warning - %s

en	Devices with the same description - %s

en	Devices in more than one tree - %s

en	Devices without Graphs - %s

en	Devices without tree - %s

en	Devices with default public/private community - %s

en	Plugin Monitor - Unmonitored hosts - %s

en	The busiest

en	Panels that finds the busiest hosts.

en	Busiest CPU

en	Devices with the busiest CPU (Host MIB)

en	Busiest ucd/net - Load

en	Devices with the highest Load (ucd/net)

en	Busiest Hard Drive Space

en	Devices with the highest Hard Drive Space used (Host MIB)

en	Busiest uptime

en	Devices with the highest uptime

en	Busiest Interface in/out traffic

en	Devices with the highest in/out traffic (Interface)

en	Busiest Interface error

en	Devices with the highest errors/discards (Interface)

en	Busiest Interface utilization

en	Ports with the highest interface utilization

en	Please enable and configure DS stats

en	Ask admin to enable DS stats

en	Average

en	Peak

en	Average of all allowed DS

en	Waiting for data or you don't have permission for any device with this template.

en	You don't have permissions to any hosts or there isn't any host with this template

en	Uptime

en	Average of all allowed hosts

en	Waiting for data or you don't have permission for any device

en	Direction

en	Time interval last 5 minutes

en	Busiest 30 Host MIB CPU utilization (last hour)

en	Install TopX plugin for more DS statistics

en	Busiest 30 ucd/net Load (last hour)

en	Busiest 30 Host MIB Hard Drive space (last hour)

en	Busiest traffic (in+out)

en	Busiest interface utilization

en	Graphical Panels

en	Panels that provide information about Cacti and it's plugins in a Graphical way.

en	Data Sources

en	Graph of Data Sources

en	Device Templates

en	Graph of Device Templates

en	Devices by Status

en	Graph of Devices by Status (up,down,...)

en	Datasources:

en	Device Templates:

en	Devices:

en	Down

en	Recovering

en	Data Type

en	Total

en	No untemplated datasources found

en	Devices

en	Device Count

en	All

en	Up

en	Template Name

en	Total Devices

en	No device templates found

en	MacTrack Panels

en	Panels that provide information about Cacti's MacTrack plugins.

en	MacTrack Plugin

en	Various MacTrack collection and site statistics.

en	MacTrack Sites

en	Various MacTrack Site statistics.

en	MacTrack Plugin not Installed/Running

en	All: %s

en	Up: %s

en	Down: %s

en	Error: %s

en	Unknown: %s

en	Disabled: %s

en	MacTrack

en	Error

en	Unknown

en	You don't have plugin permission

en	Site

en	IPs

en	Ports

en	Ports up

en	MACs

en	Device Errors

en	No mactrack sites found

en	Miscellaneous Panels

en	Panels that general non-categorized data about Cacti's.

en	NTP/DNS Status

en	Checking your Cacti system clock for drift from a known baseline and DNS resolving check

en	Maint Plugin Details

en	Maint Plugin details on upcoming schedules

en	Webseer Details

en	Plugin webseer URL Service Check Details

en	Servcheck plugin Details

en	Plugin ServCheck Details

en	No NTP server configured

en	Wrong NTP server configured - %sPlease fix it in settings

en	Failed to get NTP time from %s

en	Please check time as it is off by more

en	than %s seconds from NTP server %s.

en	Localtime is equal to NTP server

en	Unable to contact the NTP server indicated.

en	Please check your configuration.

en	No DNS hostname configured

en	Wrong DNS hostname configured - %sPlease fix it in settings

en	DNS hostname (%s) resolving ok.

en	DNS resolv time: %s ms

en	DNS hostname (%s) resolving failed.

en	Maint plugin is not installed/enabled

en	Plugin Webseer isn't installed or started

en	Webseer plugin no longer supported, use plugin servcheck instead

en	Number of checks (all/disabled):

en	Status (up/down):

en	Last log messages

en	URL

en	HTTP code

en	OK

en	Webseer Plugin - Details

en	Plugin Servcheck isn't installed or started

en	Status (ok/error):

en	Last log records

en	Test

en	Type

en	Servcheck Plugin - Details

en	Poller Panels

en	Panels that provide information about Cacti's polling process.

en	Poller Information

en	Various information about your Cacti poller.

en	Poller Statistics

en	Various Cacti poller statistics.

en	Poller Output Items

en	ID

en	Name

en	Total Time

en	New/Idle

en	Running

en	Idle

en	Unkn/down

en	%s Secs

en	(ok)

en	(all)

en	ID:

en	Seconds

en	Poller Details

en	Average Time

en	Max Time

en	Poller output items

en	Items

en	Syslog Panels

en	Panels that provide information about Cacti's Syslog message processing.

en	Syslog Details

en	Various Syslog Plugin statistics.

en	Incoming

en	Stored

en	Messages

en	Syslog plugin not installed/running

en	System Panels

en	Panels that provide information about Cacti system performance.

en	Information

en	Various system information about the Cacti system itself.

en	Administrative Alerts

en	Extra admin notify panel for all users

en	Boost Statistics

en	Information about Cacti's performance boost process.

en	24 Hour Extremes

en	Table with 24 hours of Polling Extremes (longest poller run, down hosts)

en	CPU Utilization

en	CPU utilization Graph (only Linux).

en	CPU Load:

en	This function is not implemented on Windows platforms

en	Avg CPU

en	Max CPU

en	Cacti Version:

en	Poller Type:

en	Spine

en	Spine version:

en	You are using incorrect spine version!

en	Poller Type:

en	Running on:

en	Overrun Warning

en	Timed Out

en	Other

en	Never Run

en	Boost Status is: %s

en	Processes/Frequency: %s / %s

en	Pending Records Threshold: %s

en	Approximate Next Start Time: %s

en	Pending/Archived Records: %s / %s

en	Current Boost Table(s) Size: %s

en	Avg Bytes/Record: %s

en	Last run duration/updates: %s / %s

en	Poller Run

en	Down Hosts

en	Triggered

en	Poller out. itms

en	48 Hour Extreme Polling

en	Long Running Poller

en	Max Device Down

en	Max Thold Triggered

en	Poller Output Item

en	Failed Polls

en	Threshold Panels

en	Panels that provide information about Cacti Thresholding Plugin.

en	Last Threshold Events

en	Threshold Plugin Latest Events

en	Threshold

en	Threshold Plugin Graph (all, trigerred, ...)

en	Plugin Thold isn't installed or started

en	Without events yet

en	Thresholds:

en	Thold plugin not installed/running

en	Trigerred

en	Breached

en	Threshold Details

en	Thresholds

en	Breached:

en	Triggered:

en	You don't have permission to Thresholds

en	Description

en	Top/Bottom 5 Panels

en	Panels that provide information trending information about Cacti data collection.

en	Bottom Ping

en	Devices with the worst ping response

en	Bottom Availability

en	Devices with the worst availability/reachability

en	Bottom Polling Time

en	Devices with the worst polling time

en	Bottom Polling Ratio

en	Devices with the worst polling ratio

en	Current

en	Hostname

en	Availability/Reachability

en	Polling Time

en	Ratio

en	Top 20 Hosts with Worst Ping

en	Top 20 Hosts with the Worst Availability

en	Availability

en	Top 20 Hosts Worst Polling Time

en	Top 20 Hosts with the Worst Polling Ratio

en	Intropage Viewer

en	Intropage Administration

en	System Administration

en	Timespan Last 1 Hour

en	Timespan Last %d Hours

en	Timespan Last 1 Day

en	%d Seconds

en	%d Hours

en	%d Day