en	Error

en	Unknown

en	Operating System

en	Device Driver

en	Application

en	Running

en	Runnable

en	Not Runnable

en	Invalid

en	Present

en	Warning

en	Testing

en	Down

en	Running Process History

en	OS Type

en	All

en	Device

en	Template

en	Go

en	Clear

en	Search

en	Process

en	Entries

en	Default

en	Hostname

en	Last Seen

en	Use Time (d:h:m)

en	History

en	Edit Device

en	No Process History Found

en	Running Processes

en	Path

en	Parameters

en	CPU (Hrs)

en	Memory (MB)

en	Type

en	Status

en	Processes

en	No Running Software Found

en	Total CPU [h]:

en	Total Size [MB]:

en	Avg. CPU [h]:

en	Avg. Size [MB]:

en	Hardware Inventory

en	Hardware Description

en	Hardware Type

en	Errors

en	Devices

en	No Hardware Found

en	Storage Inventory

en	Volumes

en	Storage Description

en	Storage Type

en	Percent Used

en	Used (MB)

en	Total (MB)

en	Alloc (KB)

en	No Storage Devices Found

en	Device Filter

en	Recovering

en	Up

en	Disabled

en	Actions

en	Uptime(d:h:m)

en	Users

en	CPU %

en	CPUs

en	Total Mem

en	Used Mem

en	Total Swap

en	Used Swap

en	View Storage

en	View Hardware

en	View Processes

en	View Software Inventory

en	View Graphs

en	No Graphs Defined

en	No Devices Found

en	Software Inventory

en	Applications

en	Package

en	Installed

en	No Software Packages Found

en	Summary

en	Storage

en	Hardware

en	Use History

en	Inventory

en	Graphs

en	Summary Filter

en	Top

en	All Records

en	%d Records

en	%d Record

en	NOTE: Import the Host MIB Device Package to view Graphs.

en	Device Type Summary Statistics

en	Version

en	Logins

en	CPUS

en	Avg CPU

en	Max CPU

en	Avg Mem

en	Max Mem

en	Avg Swap

en	Max Swap

en	Avg Proc

en	Max Proc

en	View Devices

en	No Device Types

en	Process Summary Filter

en	Process Summary Statistics

en	Process Name

en	Num Paths

en	Hosts

en	Avg Memory

en	Max Memory

en	No Processes

en	Custom Graph List Applied - Filtering from List

en	Graph Preview Filters

en	Delete

en	Duplicate

en	Click 'Continue' to Delete the following Host Type(s)

en	Cancel

en	Continue

en	Delete Host Type(s)

en	Click 'Continue' to Duplicate the following Host Type(s). You may optionally change the description for the new Host Type(s). Otherwise, do not change value below and the original name will be replicated with a new suffix.

en	Host Type Prefix:

en	Duplicate Host Type(s)

en	New Type

en	There were %d Device Types Added!

en	No New Host Types Found!

en	Import Results

en	Cacti has imported the following items:

en	Import Host MIB OS Types

en	Import Device Types from Local File

en	Please specify the location of the CSV file containing your device type information.

en	Overwrite Existing Data?

en	Should the import process be allowed to overwrite existing data? Please note, this does not mean delete old row, only replace duplicate rows.

en	Allow Existing Rows to be Updated?

en	Required File Format Notes

en	The file must contain a header row with the following column headings.

en	A common name for the Host Type. For example, Windows 7

en	The OS version for the Host Type

en	A unique set of characters from the snmp sysDescr that uniquely identify this device

en	The vendor specific snmp sysObjectID that distinguishes this device from the next

en	The primary key for this table is a combination of the following two fields:

en	Therefore, if you attempt to import duplicate device types, the existing data will be updated with the new information.

en	The Host Type is determined by scanning its snmp agent for the sysObjectID and sysDescription and comparing it against values in the Host Types database. The first match that is found in the database is used aggregate Host data. Therefore, it is very important that you select valid sysObjectID, sysDescrMatch for your Hosts.

en	Device Scanning Function Options

en	Name

en	Give this Host Type a meaningful name.

en	Fill in the name for the version of this Host Type.

en	System Description Match

en	Provide key information to help HMIB detect the type of Host. SQL Where expressions are supported. SQL Where wildcard character is the '%' sign. Regular Expressions have been removed due to compatibility issues.

en	Vendor snmp Object ID

en	Host MIB OS Types [edit: %s]

en	Host MIB OS Types [new]

en	Host MIB OS Type Filters

en	OS Types

en	Host Type Name

en	OS Version

en	SNMP ObjectID

en	SNMP Sys Description Match

en	No Host Types Found

en	Choose an action:

en	Rescan

en	Scan for New or Unknown Device Types

en	Import

en	Import Host Types from a CSV File

en	Export

en	Export Host Types to Share with Others

en	Host MIB Viewer

en	Host MIB Admin

en	Host MIB

en	Host MIB General Settings

en	Host MIB Poller Enabled

en	Check this box, if you want Host MIB polling to be enabled. Otherwise, the poller will not function.

en	Automatically Discover Cacti Devices

en	Do you wish to automatically scan for and add devices which support the Host Resource MIB from the Cacti host table?

en	Automatically Purge Devices

en	Do you wish to automatically purge devices that are removed from the Cacti system?

en	Default Row Count

en	How many rows do you wish to see on the HMIB OS Type by default?

en	Default Top Host Types

en	How many processes do you wish to see on the HMIB Dashboard by default?

en	%d Types

en	Default Top Processes

en	%d Processes

en	Maximum Concurrent Collectors

en	What is the maximum number of concurrent collector process that you want to run at one time?

en	%d Process

en	Host Auto Discovery Frequency

en	Auto Discovery Frequency

en	How often do you want to look for new Cacti Devices?

en	Host Graph Automation

en	Automatically Add New Graphs

en	How often do you want to check for new objects to graph?

en	Never

en	%d Hour

en	%d Hours

en	%d Day

en	%d Days

en	Host MIB Table Collection Frequencies

en	Running Programs Frequency

en	How often do you want to scan running software?

en	Running Programs CPU/Memory Frequency

en	How often do you want to scan running software for performance data?

en	Installed Software Frequency

en	How often do you want to scan for installed software?

en	Storage Frequency

en	How often do you want to scan for Storage performance data?

en	Device Frequency

en	How often do you want to scan for Device performance data?

en	Processor Frequency

en	How often do you want to scan for Processor performance data?

en	%d Minute

en	%d Minutes

en	Management

en	Normal User

en	General Administration

en	Host MIB Inventory Summary

en	Host MIB Details

en	Host MIB Storage

en	Host MIB Hardware

en	Host MIB Running Processes

en	Host MIB Process Use History

en	Host MIB Software Inventory

en	Host MIB Graphs

en	Host MIB OS Types

en	(Edit)