en	Select a Report

en	Summary

en	Source Root Domain

en	Destination Root Domain

en	Source/Destination Root Domain

en	UDP/TCP Destination Port

en	UDP/TCP Source Port

en	UDP/TCP Port

en	Source IP

en	Destination IP

en	Source/Destination IP

en	Source or Destination IP

en	IP Protocol

en	Input Interface

en	Output Interface

en	Input/Output Interface

en	Source AS

en	Destination AS

en	Source/Destination AS

en	IP ToS

en	Source Prefix

en	Destination Prefix

en	Source/Destination Prefix

en	Flow Times

en	Source/Destination IPs and Ports

en	AS Numbers

en	132 Columns

en	Show IP Accounting Emulation

en	Any Part in Range (slow)

en	End Time in Range (fast)

en	Start Time in Range (fast)

en	Entirely in Range (slow)

en	Return All Lines

en	Top %d

en	No Limit

en	%s Bytes

en	All

en	Source Domain

en	Flows

en	Bytes

en	Packets

en	Destination Domain

en	Port

en	Dest IP

en	IP Address

en	Protocol

en	Input IF

en	Output IF

en	TOS

en	Destingation Prefix

en	N/A

en	Source IF

en	Destination IF

en	Source Port

en	Destination Port

en	Start Time

en	End Time

en	Active

en	B/Pk

en	Ts

en	Fl

en	Flags

en	Source

en	Destination

en	%d Pixels

en	General Filters

en	Filter

en	The Saved Filter to display.

en	New Filter

en	Listener

en	The Listener to use for the Filter.

en	Flow Template ID

en	The Flow Template ID for v9 and IPFIX Flows only. Note that Template ID's may differ from manufacturer to manufacturer.

en	Stream Address

en	The Stream IP Address or Hostname from the list of registered streams.

en	Presets

en	If this Filter is based upon a pre-defined Timespan, select it here.

en	Detailed Filter Criteria

en	Report Type

en	The Report Type to use by default for this Filter when creating a Report.

en	Printed

en	Statistical

en	Statistical Report

en	The Display Report Type to use by default for this Filter when creating a Report.

en	Printed Report

en	The Printed Report Type to use by default for this Filter when creating a Printed Report.

en	Range Rules

en	Constrain the Filter Data by these time filter rules.

en	Resolve IP's

en	Resolve IP Addresses to Domain Names.

en	Yes

en	No

en	Sort Field

en	The default Sort Field for the Filter. This setting will be applied for any Scheduled Reports.

en	Maximum Rows

en	The Maximum Rows to provide in the Filter. This setting will be applied for any Scheduled Reports.

en	Minimum Bytes

en	The Minimum Total Bytes to consider for the Filter. Any flow totals that are less than this many bytes will be ignored.

en	Charting Options

en	Graph Type

en	The Graph Type to display by default. They include Bar, Pie, and Treemap.

en	Bar Chart

en	Pie Chart

en	Treemap Chart

en	Graph Height

en	The Graph Hight to use by default.

en	Table Panel

en	Should the Table Panel be displayed by default.

en	Bytes Panel

en	Should the Bytes Panel be displayed by default.

en	Packets Panel

en	Should the Packets Panel be displayed by default.

en	Flows Panel

en	Should the Flows Panel be displayed by default.

en	Protocol Filters

en	Protocols

en	Select the Specific Protocol for the Filter.

en	TCP Flags

en	The TCP Flags to search for in the Filter. This can be a comma delimited list of TCP Flags

en	TOS Fields

en	The TOS Fields to search for in the Filter. This can be a comma delimited list of TOS Fields

en	Filter on the select Source IP for in the Filter. This can be a comma delimited list of IPv4 or IPv6 addresses, or a comma delimited list of IPv4 or IPv6 address ranges in CIDR format (eg. 192.168.1.0/24).

en	Source Ports

en	Filter on the select Source Ports for in the Filter. This can be a comma delimited list of Source Ports.

en	Source Interface

en	Filter on the select Source Interface for in the Filter. This can be a comma delimited list of Source Interfaces

en	Filter on the select Destination AS for in the Filter. This can be a comma delimited list of Source AS's

en	Filter on the select Destination IP for in the Filter. This can be a comma delimited list of IPv4 or IPv6 addresses, or a comma delimited list of IPv4 or IPv6 address ranges in CIDR format (eg. 192.168.1.0/24).

en	Dest Ports

en	Filter on the select Destination Ports for in the Filter. This can be a comma delimited list of Destimation Ports.

en	Dest Interface

en	Filter on the select Destination Interface for in the Filter. This can be a comma delimited list of Destimation Interfaces.

en	Dest AS

en	Filter on the select Destination AS for in the Filter. This can be a comma delimited list of Destimation AS's

en	DNS Cache

en	CIDR/Routes

en	Autonomous Numbers

en	AS Blocks

en	AS Sets

en	Route Sets

en	Domains

en	Filter Sets

en	Peering Sets

en	Network

en	Internet Routers

en	Incident Response Teams

en	Auth Agents

en	Organizations

en	Roles

en	Persons

en	Unable to Delete Flow Filter '%s' as its in use in a Scheduled Report.

en	Flow Filter '%s' Deleted.

en	Delete

en	DNS Cache has been purged. It will refill as records come in.

en	Internet Route Registry Details

en	Authorized Agent Details

en	CIDR/Route

en	Autonomous Number

en	AS Block

en	AS Set

en	Route Set

en	Domain

en	Filter Set

en	Peering Set

en	Internet Router

en	Incident Response Team

en	Auth Agent

en	Organization

en	Role

en	Person

en	Router Set

en	Remarks

en	Last Modified

en	Registration Date

en	MNT By

en	Admin Contact

en	Changes

en	Notify

en	Description

en	Tech Contact

en	MNT Lower

en	Country

en	Abuse Email

en	Fax Number

en	Phone

en	Email

en	Address

en	Status

en	Members By Fef

en	Abuse Contacts

en	MNT Reference

en	Members

en	MNT Notify

en	Authorization

en	MNT Routes

en	Member of

en	Updates Email

en	NOC Handle

en	Sponsor Org

en	MNT Irt

en	MP Members

en	Sub Domain

en	Pingable

en	Alias

en	Org Type

en	Refer To

en	MP Peering

en	Export

en	Holes

en	MP Default

en	Components

en	RS Out

en	Organization Name

en	AS Name

en	Author

en	IRT Notify

en	Aggr MTD

en	AS Type

en	MP Filter

en	Default Route

en	Assignment Size

en	Export Comps

en	RS In

en	Net Name

en	DS Rdata

en	Aggr Boundary

en	MP Import

en	Language

en	RESFful Link

en	Peer

en	Zone Contact

en	Inject

en	MP Peer

en	Referral By

en	Form

en	MNT Domains

en	Origin AS

en	MP Export

en	Encyption

en	Geo Feed

en	Geo Index

en	Interface Addr

en	Export Via

en	Trouble

en	Name Servers

en	Ping Handle

en	Interface

en	Import

en	Signature

en	Geo Location

en	Local AS

en	Import Via

en	FATAL: Unknown Database Table %s

en	Search

en	Any

en	Entries

en	Default

en	Go

en	Set/Refresh Filters

en	Clear

en	Clear Filters

en	Purge

en	Purge the DNS Cache

en	Not Specified

en	No Matching Entries Found

en	Click 'Continue' to delete the following DNS Cache Entriy.

en	Cancel

en	Continue

en	Delete DNS Entry

en	Flowview DNS Cache Entries

en	Verified

en	Unverified

en	This is the IP Address of the Cache entry.

en	DNS Hostname

en	The DNS Name assigned to the IP Address.

en	The source of the DNS Hostname. It can either be DNS, Static Lookup or ARIN.

en	Arin Verified

en	The Arin information for this IP Address is verified, or it's a Local Domain IP Address.

en	CIDR ID

en	The Arin primary key. This is not official Arin information.

en	Autonomous System ID

en	The Arin Origin AS. This is official Arin AS information.

en	Updated Time

en	This is the time that the DNS cache was entered or last updated.

en	No DNS Cache Entries Found

en	Flowview Internet Routes

en	IP Version

en	IPv4

en	IPv6

en	Route

en	This is the published Internet Route.

en	AS Number

en	The Autonomous System Number for the route.

en	Route Description

en	The Descrption logged by the Route Maintainer.

en	The source database used to publish the route.

en	Maintained By

en	The Internet Carrier who is maintaining the route for the customer.

en	The last time the information on this route was modified.

en	No Matching Routes Found

en	Listener Name

en	Name of the device to be displayed.

en	Collection Method

en	There are two support collection methods, the first utilizes the legacy flow-tools binaries and the second leverages Cacti's own PHP based flow stream server.

en	Allowed Host

en	IP Address of the device that is allowed to send to this flow collector. Leave as 0 for any host.

en	Port this collector will listen on.

en	The IP Protocol to use for this listener.

en	TCP Protocol

en	UDP Protocol

en	No Flow Template was found for Device ID:%s and Template ID:%s

en	Click 'Continue' to delete the following Net-Flow Listeners. After which, you will need to restart your Flow-Capture Service.

en	You must select at least one device.

en	Save Successful. The Flowview Listener has been saved, and the service restarted.

en	Save Successful. The Flowview Listener has been saved. However, the service flow-capture is not running.

en	Listener [edit: %s]

en	Listener [new]

en	Name

en	Version

en	Templates

en	Last Updated

en	Active Streams update every 5 minutes

en	No Inbound Streams Detected

en	Listener Detected Templates

en	Ex Addr

en	Template

en	Template ID

en	Field Name

en	Supported

en	Field ID

en	Field Type

en	Length

en	Unpack

en	No Inbound Stream Templates Detected

en	FlowView Listeners

en	Listeners

en	Method

en	Allowed From

en	Observed Listen

en	The port security actually observed on the listeners port.

en	Streams

en	The number of inbound connections from various sources.

en	Stream Versions

en	The Traffic Flow versions being observed.

en	The maximum update time from all streams being collected. This value is updated every 5 minutes.

en	Cacti

en	No Flowview Listeners

en	Send Now

en	Disable

en	Enable

en	Click 'Continue' to delete the following Filter(s) and all matching Filter.

en	Click 'Continue' to Disable the following Filters(s) and all matching Filter.

en	Click 'Continue' to Enable the following Filters(s).

en	You must select at least one Filter.

en	FlowView Filters

en	FlowView Filters [ Add Devices before Filters ]

en	Filters

en	Filter Name

en	ID

en	Resolution

en	Every Hour

en	Every %d Hours

en	Every Day

en	Every Week

en	Every %d Weeks, 2

en	Every Month

en	Title

en	New Schedule

en	Enter a Report Title for the FlowView Schedule.

en	Enabled

en	Whether or not this NetFlow Scan will be sent.

en	Name of the query to run.

en	Send Interval

en	How often to send this NetFlow Report?

en	This is the first date / time to send the NetFlow Scan email. All future Emails will be calculated off of this time plus the interval given above.

en	Email Addresses

en	Email addresses (command delimited) to send this NetFlow Scan to.

en	Format File to Use

en	Choose the custom html wrapper and CSS file to use. This file contains both html and CSS to wrap around your report. If it contains more than simply CSS, you need to place a special <REPORT> tag inside of the file. This format tag will be replaced by the report content. These files are located in the 'formats' directory.

en	Sent Scheduled Report %s in Background.

en	Reports will arrive once Complete.

en	Click 'Continue' to delete the following Schedule(s).

en	Click 'Continue' to send the following Schedule(s) now.

en	Click 'Continue' to Disable the following Schedule(s).

en	Click 'Continue' to Enable the following Schedule(s).

en	You must select at least one schedule.

en	Report: [edit: %s]

en	Report: [new]

en	Start Date Selector

en	FlowView Schedules

en	FlowView Schedules [ Add Devices before Schedules ]

en	Schedules

en	Schedule Title

en	Interval

en	Start Date

en	Next Send

en	General

en	Select a Report Type First

en	Filter: [edit: %s]

en	Filter: [new]

en	Undefined Filter [ Select Filter to get Details ]

en	Statistical Report: %s [ Including overrides as specified below ]

en	Printed Report: %s [ Including overrides as specified below ]

en	Select a Filter

en	Select a Listener

en	Exclude

en	None

en	Top Sample

en	Top %d Samples

en	Show only Domains on Charts Below

en	Domains/Hostnames Only

en	Apply Filter

en	Clear Filter

en	Create new Flow Filter

en	New

en	Edit

en	Edit the Flow Filter

en	Save

en	Save the Flow Filter

en	Save As

en	Save the existing Flow Filter as new Filter

en	Rename

en	Rename the Flow Filter

en	Delete the Flow Filter

en	Report

en	Statistical: %s

en	Printed: %s

en	Select a Filter First

en	Lines

en	Octets

en	Timespan

en	Custom

en	From

en	To

en	End Date Selector

en	Shift Time Backward

en	Define Shifting Interval

en	Shift Time Forward

en	Graph

en	Bar

en	Pie

en	Treemap

en	Height

en	Show/Hide

en	Table

en	Save Flow Filter

en	New Name

en	Delete Flow Filter

en	To Delete this Flow Filter, press Continue. If the Flow Filter is in use in a Scheduled Report, the operation will be blocked.

en	Top %s Distribution Chart of Bytes

en	Top %s Pie Chart of Bytes

en	Top %s Treemap Chart of Bytes

en	Top %s Distribution Chart of Packets

en	Top %s Pie Chart of Packets

en	Top %s Treemap Chart of Packets

en	Top %s Distribution Chart of Flows

en	Top %s Pie Chart of Flows

en	Top %s Treemap Chart of Flows

en	Rename Layout

en	<new>

en	Filter Settings Saved

en	Client/Private (%s)

en	icmp (0)

en	Unknown (%s)

en	Cacti Flowview

en	Netflow - %s

en	Subnet Filter: %s is not a value CIDR format

en	unresolved

en	%d - %d Bytes

en	> %d Bytes

en	Source DNS

en	Source Root DNS

en	Dest DNS

en	Dest Root DNS

en	DNS

en	Root DNS

en	Dest Port

en	Dest IF

en	Dest Prefix

en	Type of Service

en	Bytes/Packet

en	The Parallel Query Timed Out. Please contact your administrator

en	Boolean: %s, Numeric: %s, Hex: %s

en	Low Delay

en	Throughput

en	Reliability

en	Mincost

en	Net Control

en	Internet Control

en	Critic ECP

en	Flash Override

en	Flash

en	Immediate

en	Priority

en	Routine

en	Summary Statistics

en	IP Packet Size Distribution (%%)

en	Packets per Flow Distribution (%%)

en	Octets per Flow Distribution (%%)

en	Flow Time Distribution (%%)

en	You must select a Statistics Report or Printed Report!

en	You must select only a Statistics Report or a Printed Report (not both)!

en	Invalid dates, End Date/Time is earlier than Start Date/Time!

en	Invalid IP for the Source Address!<br>(Must be in the form of '192.168.0.1')

en	Invalid subnet for the Source Address!<br>(Must be in the form of '192.168.0.1/255.255.255.0' or '192.168.0.1/24')

en	Invalid IP for the Destination Address!<br>(Must be in the form of '192.168.0.1')

en	Invalid subnet for the Destination Address!<br>(Must be in the form of '192.168.0.1/255.255.255.0' or '192.168.0.1/24')

en	Invalid value for Source Interface!

en	Invalid value for Source Port! (0 - 65535)

en	Invalid value for Source AS! (0 - 65535)

en	Invalid value for Destination Interface!

en	Invalid value for Destination Port! (0 - 65535)

en	Invalid value for Destination AS! (0 - 65535)

en	Invalid value for Protocol! (1 - 255)

en	Invalid value for TCP Flag! (ex: 0x1b or 0x1b/SA or SA/SA)

en	Invalid value for Cutoff Octets!

en	Invalid value for Cutoff Lines!

en	Invalid value for Sort Field!

en	FlowView Chart for %s Type is %s

en	Not Supported

en	Total Flows

en	Bytes Exchanged

en	Packets Examined

en	Plugin -> Flow Viewer

en	Plugin -> Flow Admin

en	Please rename either your config.php.dist or config_local.php.dist files in the flowview directory, and change setup your database before installing.

en	Please be advised the Flowview plugins Tables are being upgraded in the background. This may take some time. Check the Cacti log for more information

en	The Filter has been Deleted

en	The Filter has been Updated

en	Import/Export

en	FlowView

en	Databases

en	Normal User

en	System Administration

en	Flow Viewer

en	Dashboard

en	(save)

en	(edit)

en	(actions)

en	Name Resolution

en	Hostname Resolution

en	The method by which you wish to resolve hostnames.

en	Use Local Server

en	Use DNS Servers under Mail/Reporting/DNS

en	Don't Resolve DNS

en	Local Domain Name

en	For IPv4 addresses on the local network that do not resolve locally, append this suffix to the resultant ip address.

en	Local IP Range

en	Provide the IPv4 ip address range for your local network for hosts that may not be registered in DNS. These hosts will be mapped to the Local Domain Name above. This more for home users. You can use either CIDR or non-CIDR formats. For examle: 192.168.11.0 or 192.168.11.0/24

en	Use CIDR or Non-CIDR

en	Use Arin to find Domains and AS Numbers

en	Many Big Tech data collection services like to mask their ownership of domains to obfuscate the fact that they are collecting your personal information. If you are concerned with this and your Cacti install has access to the Internet, you can use Arin to remove the mask from those Big Tech companies.

en	Whois Provider Host

en	Please provide the hostname for resolving whois calls. If not null, you must have the whois binary in your system path.

en	whois.radb.net

en	Whois Binary Path

en	Please provide the pathname for the 'whois' binary. The 'whois' binary will be used to find AS information supplementing Arin.

en	Enter binary path

en	Data Retention and Report Generation

en	Data Retention Policy

en	The amount of time Cacti will maintain the partitioned Flow tables.

en	%d Week

en	%d Weeks

en	%d Month

en	%d Months

en	%d Year

en	Database Partitioning Scheme

en	Depending on the number of flows per minute, you may require more tables per day.

en	Daily

en	Hourly

en	Storage Engine for Raw Tables

en	The Aria Engine is perfect for all but the Live raw table. The Live raw table will always be InnoDB. Take your pick.

en	Aria (Fast, Crash Safe)

en	InnoDB (Slow, High Concurrency)

en	Parallel Queries

en	Max Concurrent Threads

en	The maximum number of threads that will be dispatched to run the FlowView queries. Note that you can have at most 1 thread per database partition, and you should be careful not to overload your database server with having too many concurrent threads running.

en	Disabled

en	%d Threads

en	Maximum Run Time

en	If the Parallel Query does not finish in this time, exit.

en	%d Minute

en	%d Minutes

en	Cached Data Time to Live

en	How long should FlowView hold onto Cached Query results before purging them?

en	%d Hours

en	%d Day

en	%d Days

en	MaxScale Sharding

en	Leverage MaxScale to Distribute Query Shards

en	If you have multiple service acting as slaves for MaxScale, you can increase the speed of querying by distributing the parallel queries to multiple MariaDB backend servers.

en	MaxScale Read-Only Port

en	This should be the port of the Read-Only-Service (readconnroute) service and router.

en	Flowview