en	No Graphs Found Matching Criteria

en	Cycle Graph Filter

en	Next Update In

en	Graph Display Timespan

en	Cycle Rotation Refresh Frequency

en	Number of Graphs per Page

en	Cycle to Previous Graphs

en	Prev

en	Stop

en	Stop Cycling

en	Resume Cycling

en	Start

en	Cycle to Next Graphs

en	Next

en	Refresh

en	Refresh Graphs Now

en	Clear

en	Clear Filter

en	Save

en	Save Filter Settings

en	Number of Graph Columns

en	Graph Height

en	Graph Width

en	Display Graph Legend

en	Legend

en	Select Tree to View

en	Select Tree Leaf to Display

en	All Levels

en	Top Level

en	Enter Regular Expression Match (only alpha, numeric, and special characters \"(^_|?)\" permitted)

en	Cycle Graphs

en	%d Graph

en	%d Graphs

en	%d Column

en	%d Columns

en	Plugin -> Cycle Graphs

en	Cycle

en	Delay Interval

en	This is the time in seconds before the next graph is displayed.

en	Graph Timespan

en	This is the default timespan that will be displayed on the page.

en	Column Count

en	In Tree Mode this is the number of columns that will be used.

en	Select the number of graphs to display per page

en	This sets the graph height for the displayed graphs.

en	This sets the graph width for the displayed graphs.

en	Display Legend

en	Check this to display legend.

en	Predefined Rotations

en	Rotation Type

en	Select which method to use for custom graph rotation. If you select 'Specific List', you must define a list of Graph ID's

en	Legacy (All)

en	Specific List

en	Tree Mode

en	Custom Graph List

en	This must be a comma delimited list of Graph ID's to cycle through. For example '1,2,3,4'

en	Default Tree

en	Select the graph tree to cycle if Tree Mode is selected

en	%d Pixels

en	Cycling