en	There are problems with the Change Password page. Contact your Cacti administrator right away.

en	Run All

en	Run checks on currently filtered Data Sources and preserve other results

en	The Data Query ID [%s] that you are trying to Edit does not exist. Please run the repair_database.php CLI script to resolve this database issue.

en	Changing the Heartbeat from this page, does not change the Heartbeat for your existing Data Sources. Use RRDtool's 'tune' function to make that change to your existing RRDfiles heartbeats, or run the CLI utility update_heartbeat.php to correct.<br>

en	Enter a valid number of Rows to obtain the RRA size.

en	WARNING: Cacti Page:%s for User:%s Generated a Fatal Error %d!

en	The Document page '%s' count not be reached. The Cacti Documentation site is not reachable. The http error was '%s'. Consider downloading an official release to obtain the latest documentation and hosting the documentation locally.

en	Open a ticket at

en	The Help File %s was not located on the Cacti Documentation Website.

en	The Document page '%s' count not be reached locally.

en	The Class of this Device Template. The Class Name should be representative of it's function.

en	Unassigned

en	The Main Data Collector has gone to an Offline or Recovering Status

en	Access Points, Controllers

en	Facilities Related

en	Hypervisor Related

en	ILO, IPMI, iDrac, etc.

en	Licensing Related

en	Linux Related

en	NAS/SAN Related

en	Power Related PDUs/STS, etc.

en	Storage Related

en	Web Server Related

en	Windows Related

en	UPS Related

en	Replace Data Query Suggested Value Patterns

en	Replace Data Source and Graph Template Suggested Value Records for Data Queries. Graphs and Data Sources will take on new names after either a Data Query Reindex or by using the forced Replace Suggested Values process.

en	How should Cacti support Client Dates based upon the Client browsers timezone.

en	Show only locations that are available at a devices selected site.

en	Enabled Gradient Support for AREA and STACK charts.

en	By default Cacti page help is located at docs.cacti.net. However, if your system does not have access to the Internet, you may download the documentation locally in HTML format and host it in the 'docs' location of you Cacti server. If you choose only to leverage the local location for page help documentation, check this checkbox.

en	. This is limited by the php setting 'max_input_vars', currently:

en	Start of Business Day

en	The time your business hours start. Format: hh:mm

en	End of Business Day

en	The time your business hours end. Format: hh:mm

en	Only show business hours during weekdays.

en	Show business hours

en	Display business hours on rrd graphs.

en	Color to use for business hours

en	The color to be shown for business hours

en	After this number of days, the business hours will not be added to the graph. Recommended: 62 days

en	Refresh Poller Table Per Cycle

en	This setting is for a single poller systems only to rebuild the poller output table on each polling cycle to prevent the memory table from swapping on very large systems with large databases that could use swap.

en	Periodic All Device Re-Index

en	At what frequency do you wish to Re-Index all Devices. This Re-Index will occur at midnight at the frequency that you select.

en	Weekly on Sunday

en	The number of concurrent Poller Command processes. The will be at most one concurrent command per host within the Poller Command pool.

en	The "Distinguished Name" syntax, applicable for both OpenLDAP and Windows AD configurations, offers flexibility in defining user identity. For OpenLDAP, the format follows this structure: "uid=<username>,ou=people,dc=domain,dc=local". Windows AD provides an alternative syntax: "<username>@win2kdomain.local", commonly known as "userPrincipalName (UPN)". In this context, "<username>" represents the specific username provided during the login prompt. This is particularly pertinent when operating in "No Searching" mode, or "Require Group Membership" enabled.

en	This refers to the specific attribute within the LDAP directory that holds the usernames of group members. It is crucial to ensure that the attribute value aligns with the configuration specified in the "Distinguished Name" or that the actual attribute value is searchable using the settings outlined in the "Distinguished Name".

en	Use a separate subfolder for each hosts RRD files. The naming of the RRDfiles will be one of the following:<br><ul><li>&lt;path_cacti&gt;/rra/host_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_id/data_query_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/data_query_id/local_data_id.rrd.</li></ul><br>You can make this change after install by running the CLI script <b>structure_rra_paths.php</b> after you make the change. NOTE: If you change Max Directories value to decrease the number of directories, or if you change the Directory Pattern, empty directories will not be pruned after you rerun the <b>structure_rra_paths.php</b> script.

en	Which Directory Pattern do you wish to use for Structured RRD Paths. 'Device ID' is the default. The setting 'Device ID/Data Query ID' should be used when you have Devices with thousands of Graphs. After Changing the Directory Pattern, you must run the Structured Path CLI script again to modify the RRDfile paths to the new Pattern.

en	Device Hash/Device ID/Data Query ID

en	Max Device Hash Directories

en	The maximum number of Device Directories to be created based upon hashed Device ID's.

en	How would you like Cacti to present dates? This setting will also change the way that Cacti Graphs dates are represented.

en	My Browsers Timezone

en	Attempted SQL Injection found in Tree Automation for the field variable.

en	Remote Poller %s is Down, you will need to perform a FullSync once it is up again

en	No index[%s] in value_index_parse, skipping.

en	Bogus rewrite_value item found, index='%s'

en	Could not parse translation map (rewrite_value)

en	WARNING: PollerID:%s has an invalid hostname:%s. Is it not reachable via DNS!

en	WARNING: Key Cacti Include File %s missing. Please locate and replace this file

en	Attempted SQL Injection

en	There was a SQL Injection attempted on the page

en	A client attempted to create a SQL Injection into Cacti likely from an external host with the address %s

en	Cacti regular expressions are limited to 50 characters only for security reasons.

en	Cacti regular expressions can not includes the semi-color character.

en	The specificed value appears to be different in the running config versus the INI file.

en	The Plugin directory '%s' needs to be renamed to remove 'plugin_' from the name before it can be installed.

en	The Plugin in the directory '%s' does not include an version function '%s()'. This function must exist for the plugin to be installed.

en	The Plugin in the directory '%s' does not include an install function '%s()'. This function must exist for the plugin to be installed.

en	The pdp_per_row of '%s' is invalid for RRA '%s' should be '%s'. Consider deleting and allowing Cacti to re-create RRDfile.

en	NOTE: Graph not added for Data Query %s and index %s due to Data Source verification failure

en	When performing joins, if they are below this size, they will be kept in memory and never written to a temporary file. As this is a per connection memory allocation, care must be taken not to increase it too high. The sum of the join_buffer_size + sort_buffer_size + read_buffer_size + read_rnd_buffer_size + thread_stack + binlog_cache_size + Core MySQL/MariaDB memory should be below 80%. If the recommendation is negative, you must decrease this and or the sort_buffer_size until the recommendation fits within the allowable memory.

en	Key Generation Required to Use Plugin

en	Package Key Information Not Found

en	In order to use this Plugin, you must first run the genkey.php script in the plugin directory. Once that is complete, you will have a public and private key used to sign your packages.

en	You have not Trusted this Package Author. If you wish to import, check the Automatically Trust Author checkbox

en	The Package %s Import Failed

en	See the cacti.log for more information. It could be that you had either an API Key error or the package was tamered with, or the location is not available.

en	The package "%s" download or validation failed

en	See the cacti.log for more information. It could be that you had either an API Key error or the package was tamered with, or the location is not available

en	The package download or validation failed

en	The XML files appears to be invalid. Please contact the package author

en	Check the package repository file for files that should exist and find the one that is missing

en	The XML files for the package does not exist

en	Import Package Filenames [ None selected imports all, Check to import selectively ]

en	Differences

en	Import Package Templates [ None selected imports all, Check to import selectively ]

en	File Differences for:

en	The *.xml.gz file located on your Local machine to Upload and Import.

en	If checked, Cacti will automatically Trust the Signer for this and any future Packages by that author.

en	Replace Data Source and Graph Template Suggested Value Records. Graphs and Data Sources will take on new names after either a Data Query Reindex or by using the forced Replace Suggested Values process.

en	Main / Remote Status

en	WARNING: PollerID:%s with Name:%s is in Heartbeat Status

en	Poller in Heartbeat Mode

en	RRD check is disabled, please enable in Configuration -> Settings -> Data

en	Message

en	%d day

en	Messages

en	Changing Permission Model Warning

en	Changing Permission Model will alter a users effective Graph permissions.

en	After you change the Graph Permission Model you should audit your Users and User Groups Effective Graph permission to ensure that you still have adequate control of your Graphs. NOTE: If you want to restrict all Graphs at the Device or Graph Template Graph Permission Model, the default Graph Policy should be set to 'Deny'.

en	The Template Import Succeeded.

en	See the cacti.log for more information, and review the XML file for proper syntax. The error details are shown below.<br><br><b>Errors:</b><br>%s

en	The Template XML file "%s" validation failed

en	Import Files [ If Files are missing, locate and install before using ]

en	Import Templates [ None selected imports all, Check to import selectively ]

en	Met: %d

en	Unmet: %d

en	Some CDEF Items will not import due to an export error! Contact Template provider for an updated export.

en	MySQL/MariaDB Memory Statistics (Source: MySQL Tuner)

en	Reduce MySQL/MariaDB Memory to less than 80% of System Memory. Preserve additional Cache Memory for RRDfiles if the Database is on the same system as the RRDfiles. See Core and Client Totals below for explanation of calculation method.

en	Reduce Total Core Memory

en	Calculation Formula

en	Max Connection Memory Possible

en	Reduce Total Client Memory

en	NOTE: On large systems, this command may take several minutes to hours to complete and therefore should not be run from the Cacti UI. You can simply run 'php -q cli/rebuild_poller_cache.php --help' at the command line for more information.

en	Use this utility to display problems with missing rrd files or missing values in rrdfiles. You need enable rrdcheck in Configuration->Settings->Data

en	Records: %s (ds rows), Time: %s (secs), GetRows: %s (secs), ResultsCycle: %s (secs), FileAndTemplate: %s (secs), LastUpdate: %s (secs), RRDUpdate: %s (secs), Delete: %s (secs)

en	Status: Running, Remaining: %s (dses), CurrentRuntime: %s (secs), PrevRuntime: %s (secs), PrevProcessed: %10s (ds rows)

en	Status: Idle, PrevRuntime: %s (secs), PrevProcessed: %10s (ds rows)