en	After you change the Graph Permission Model you should audit your Users and User Groups Effective Graph permission to ensure that you still have adequate control of your Graphs. NOTE: If you want to restrict all Graphs at the Device or Graph Template Graph Permission Model, the default Graph Policy should be set to 'Deny'.

en	Poller Interval must be less than Cron Interval

en	Select Plugin(s)

en	Plugins Selected

en	Select File(s)

en	Files Selected

en	Select Template(s)

en	All Templates Selected

en	Send a Test Email

en	Test Email Results

en	Site Information

en	The primary name for the Site.

en	New Site

en	Address Information

en	Address1

en	The primary address for the Site.

en	Enter the Site Address

en	Address2

en	Additional address information for the Site.

en	Additional Site Address information

en	City

en	The city or locality for the Site.

en	Enter the City or Locality

en	State

en	The state for the Site.

en	Enter the state

en	Postal/Zip Code

en	The postal or zip code for the Site.

en	Enter the postal code

en	Country

en	The country for the Site.

en	Enter the country

en	The TimeZone for the Site.

en	Geolocation Information

en	Latitude

en	The Latitude for this Site.

en	example 38.889488

en	Longitude

en	The Longitude for this Site.

en	example -77.0374678

en	Zoom

en	The default Map Zoom for this Site. Values can be from 0 to 23. Note that some regions of the planet have a max Zoom of 15.

en	0 - 23

en	Additional Information

en	Additional area use for random notes related to this Site.

en	Enter some useful information about the Site.

en	Alternate Name

en	Used for cases where a Site has an alternate named used to describe it

en	If the Site is known by another name enter it here.

en	Template Site was not found! Unable to duplicate.

en	Click 'Continue' to Delete the following Site. Note, all Devices will be disassociated from this site.

en	Delete Site

en	Click 'Continue' to Duplicate the following Site.

en	Site Name:

en	Duplicate Site

en	Site Name

en	The name of this Site.

en	The unique id associated with this Site.

en	The number of Devices associated with this Site.

en	The City associated with this Site.

en	The State associated with this Site.

en	The Country associated with this Site.

en	No Sites Found

en	FATAL: Spike Kill method '%s' is Invalid

en	FATAL: Spike Kill Not Allowed

en	WARNING: Export Errors Encountered. Refresh Browser Window for Details!

en	What would you like to export?

en	Select the Template type that you wish to export from Cacti.

en	Device Template to Export

en	Choose the Template to export to XML.

en	Include Dependencies

en	Some templates rely on other items in Cacti to function properly. It is highly recommended that you select this box or the resulting import may fail.

en	Output Format

en	Choose the format to output the resulting XML file in.

en	Output to the Browser (within Cacti)

en	Output to the Browser (raw XML)

en	Save File Locally

en	Available Templates [%s]

en	The Template Import Succeeded.

en	Error in Template
uk	Шаблони Експорту

en	See the cacti.log for more information, and review the XML file for proper syntax. The error details are shown below.<br><br><b>Errors:</b><br>%s

en	The Template XML file "%s" validation failed

en	Import Files [ If Files are missing, locate and install before using ]

en	File Name
uk	Ім'я Поля

en	Not Readable

en	Import Templates [ None selected imports all, Check to import selectively ]

en	Dependencies

en	Damaged

en	Met: %d

en	Unmet: %d

en	Some CDEF Items will not import due to an export error! Contact Template provider for an updated export.

en	Import Template

en	ERROR
uk	Помилка

en	Failed to access temporary folder, import functionality is disabled

en	Publish

en	Un-Publish

en	Un-Lock

en	inherit

en	manual

en	alpha

en	natural

en	numeric

en	Click 'Continue' to delete the following Tree.

en	Delete Tree

en	Click 'Continue' to publish the following Tree.

en	Publish Tree

en	Click 'Continue' to un-publish the following Tree.

en	Un-publish Tree

en	Click 'Continue' to un-lock the following Tree.

en	Un-lock Tree

en	Trees [edit: %s]

en	Trees [new]

en	Edit Tree

en	To Edit this tree, you must first lock it by pressing the Edit Tree button.

en	Add Root Branch

en	Finish Editing Tree

en	This tree has been locked for Editing on %s by %s.

en	To edit the tree, you must first unlock it and then lock it as yourself

en	Tree Items

en	Available Sites

en	Available Devices

en	Available Graphs

en	New Node

en	Rename

en	Branch Sorting

en	Inherit

en	Alphabetic

en	Natural

en	Cut

en	Paste

en	Add Tree

en	Sort Trees Ascending

en	Sort Trees Descending

en	Tree Name

en	The name by which this Tree will be referred to as.

en	The internal database ID for this Tree. Useful when performing automation or debugging.

en	Published

en	Unpublished Trees cannot be viewed from the Graph tab

en	A Tree must be locked in order to be edited.

en	The original author of this Tree.

en	To change the order of the trees, first sort by this column, press the up or down arrows once they appear.

en	Last Edited

en	The date that this Tree was last edited.

en	Edited By

en	The last user to have modified this Tree.

en	The total number of Site Branches in this Tree.

en	Branches

en	The total number of Branches in this Tree.

en	The total number of individual Devices in this Tree.

en	The total number of individual Graphs in this Tree.

en	No Trees Found

en	Batch Copy

en	You are not allowed to delete the current login account

en	You are not allowed to disable the current login account

en	Click 'Continue' to delete the selected User(s).

en	Delete User(s)

en	Click 'Continue' to copy the selected User to a new User below.

en	Template Username:

en	Username:

en	Full Name:

en	Realm:

en	Copy User

en	Click 'Continue' to enable the selected User(s).

en	Enable User(s)

en	Click 'Continue' to disable the selected User(s).

en	Disable User(s)

en	Click 'Continue' to overwrite the User(s) settings with the selected template User settings and permissions. The original users Full Name, Password, Realm and Enable status will be retained, all other fields will be overwritten from Template User.

en	Template User:

en	User(s) to update:

en	Reset User(s) Settings

en	Deny

en	Note: System Graph Policy is 'Permissive' meaning the User must have access to at least one of Graph, Device, or Graph Template to gain access to the Graph

en	Note: System Graph Policy is 'Restrictive' meaning the User must have access to either the Graph or the Device and Graph Template to gain access to the Graph

en	Note: System Graph Policy is 'Device' meaning the User must have access to the Graph or Device to gain access to the Graph

en	Note: System Graph Policy is 'Graph Template' meaning the User must have access to the Graph or Graph Template to gain access to the Graph

en	Default Graph Policy

en	Default Graph Policy for this User

en	Update

en	Effective Policy

en	No Matching Graphs Found

en	Revoke Access

en	Grant Access

en	Groups

en	Member

en	Policies (Graph/Device/Template)

en	Non Member

en	ALLOW

en	DENY

en	No Matching User Groups Found

en	Assign Membership

en	Remove Membership

en	Default Device Policy

en	Default Device Policy for this User

en	Access Granted

en	Access Restricted

en	No Matching Devices Found

en	Default Graph Template Policy

en	Default Graph Template Policy for this User

en	Total Graphs

en	No Matching Graph Templates Found

en	Default Tree Policy

en	Default Tree Policy for this User

en	No Matching Trees Found

en	User Permissions

en	External Link Permissions

en	Plugin Permissions

en	Legacy Permissions

en	User Settings %s

en	Permissions

en	Group Membership

en	Graph Perms

en	Device Perms

en	Template Perms

en	Tree Perms

en	User Management %s

en	User Management

en	Basic

en	LDAP/AD
uk	LDAP

en	Domain
uk	Домени Користувачів

en	User ID
uk	Користувач

en	Graph Policy

en	Device Policy

en	Template Policy

en	Last Login

en	Unavailable

en	No Users Found

en	Graph Permissions %s

en	Show All

en	Group Membership %s

en	Devices Permission %s

en	Only Show Exceptions

en	Template Permission %s

en	Tree Permission %s

en	Click 'Continue' to delete the following User Domain.

en	Delete User Domain

en	Click 'Continue' to disable the following User Domain.

en	Disable User Domain

en	Click 'Continue' to enable the following User Domain.

en	Enabled User Domain

en	Click 'Continue' to make the following the following User Domain the default one.

en	Make Selected Domain Default

en	User Domain [edit: %s]

en	User Domain [new]

en	Enter a meaningful name for this domain. This will be the name that appears in the Login Realm during login.

en	Domains Type

en	Choose what type of domain this is.

en	The name of the user that Cacti will use as a template for new user accounts.

en	If this checkbox is checked, users will be able to login using this domain.

en	TCP/UDP port for Non SSL communications.

en	TCP/UDP port for SSL communications.

en	Protocol Version that the server supports.

en	Encryption that the server supports. TLS is only supported by Protocol Version 3.

en	Mode which cacti will attempt to authenticate against the LDAP server.<blockquote><i>No Searching</i> - No Distinguished Name (DN) searching occurs, just attempt to bind with the provided Distinguished Name (DN) format.<br><br><i>Anonymous Searching</i> - Attempts to search for username against LDAP directory via anonymous binding to locate the users Distinguished Name (DN).<br><br><i>Specific Searching</i> - Attempts search for username against LDAP directory via Specific Distinguished Name (DN) and Specific Password for binding to locate the users Distinguished Name (DN).

en	Search base for searching the LDAP directory, such as "dc=win2kdomain,dc=local" or "ou=people,dc=domain,dc=local".

en	Search filter to use to locate the user in the LDAP directory, such as for windows: <i>"(&amp;(objectclass=user)(objectcategory=user)(userPrincipalName=&lt;username&gt;*))"</i> or for OpenLDAP: <i>"(&(objectClass=account)(uid=&lt;username&gt))"</i>. "&lt;username&gt" is replaced with the username that was supplied at the login prompt.

en	eMail

en	Field that will replace the email taken from LDAP. (on windows: mail)

en	Domain Properties

en	Domains

en	Domain Name

en	Domain Type

en	Effective User

en	CN FullName

en	CN eMail

en	None Selected

en	No User Domains Found

en	Defer to the Users Setting

en	Show the Page that the User pointed their browser to

en	Show the Console

en	Show the default Graph Screen

en	Restrict Access

en	Group Name

en	The name of this Group.

en	Group Description

en	A more descriptive name for this group, that can include spaces or special characters.

en	General Group Options

en	Set any user account-specific options here.

en	Allow Users of this Group to keep custom User Settings

en	Tree Rights

en	Should Users of this Group have access to the Tree?

en	Graph List Rights

en	Should Users of this Group have access to the Graph List?

en	Graph Preview Rights

en	Should Users of this Group have access to the Graph Preview?

en	What to do when a User from this User Group logs in.

en	Click 'Continue' to delete the following User Group

en	Delete User Group

en	Click 'Continue' to Copy the following User Group to a new User Group.

en	Group Prefix:

en	New Group

en	Copy User Group

en	Click 'Continue' to enable the following User Group.

en	Enable User Group

en	Click 'Continue' to disable the following User Group.

en	Disable User Group

en	Login Name

en	Membership

en	Group Member

en	No Matching Group Members Found

en	Add to Group

en	Remove from Group

en	Default Graph Policy for this User Group

en	Default Graph Template Policy for this User Group

en	Default Tree Policy for this User Group

en	Members

en	User Group Management [edit: %s]

en	User Group Management [new]

en	User Group Management

en	No User Groups Found

en	Show Members

en	Clear

en	Data Source Statistics Purged.

en	Database

en	Database Settings

en	Database Status

en	PHP Info

en	ChangeLog
uk	Change Log

en	Technical Support [%s]

en	NET-SNMP Not Installed or its paths are not set. Please install if you wish to monitor SNMP enabled devices.

en	Configuration Settings

en	ERROR: Installed RRDtool version does not exceed configured version.<br>Please visit the %s and select the correct RRDtool Utility Version.

en	ERROR: RRDtool 1.2.x+ does not support the GIF images format, but %d" graph(s) and/or templates have GIF set as the image format.

en	General Information

en	Cacti OS

en	NET-SNMP Version

en	Configured

en	Found

en	Total: %s

en	Poller Information

en	Different version of Cacti and Spine!

en	Action[%s]

en	No items to poll

en	Name:

en	Procs:

en	Threads:

en	Concurrent Processes

en	Max Threads

en	PHP Servers

en	Main Server: Current: %s, Min Required: %s

en	Local Server: Current: %s, Min Required: %s

en	Minimum Connections:

en	Assumes 100 spare connections for Web page users and other various connections.

en	The minimum required can vary greatly if there is heavy user Graph viewing activity.

en	Each browser tab can use upto 10 connections depending on the browser.

en	Script Timeout

en	Max OID

en	Last Run Statistics

en	System Memory

en	%s GB

en	MySQL/MariaDB Memory Statistics (Source: MySQL Tuner)

en	Max Total Memory Possible

en	Reduce MySQL/MariaDB Memory to less than 80% of System Memory. Preserve additional Cache Memory for RRDfiles if the Database is on the same system as the RRDfiles. See Core and Client Totals below for explanation of calculation method.

en	Max Core Memory Possible

en	Reduce Total Core Memory

en	Calculation Formula

en	Max Connection Memory Possible

en	Reduce Total Client Memory

en	PHP Information

en	PHP Version

en	PHP Version 5.5.0+ is recommended due to strong password hashing support.

en	PHP OS

en	PHP uname

en	PHP SNMP

en	Installed. Note: If you are planning on using SNMPv3, you must remove php-snmp and use the Net-SNMP toolset.

en	You've set memory limit to 'unlimited'.

en	It is highly suggested that you alter you php.ini memory_limit to %s or higher.

en	This suggested memory value is calculated based on the number of data source present and is only to be used as a suggestion, actual values may vary system to system based on requirements.

en	Variable Name

en	MySQL Table Information - Sizes in KBytes

en	Avg Row Length

en	Data Length

en	Index Length

en	Comment

en	Unable to retrieve table status

en	PHP Module Information

en	User Login History

en	Deleted/Invalid

en	Result

en	Success - Password

en	Success - Token

en	Success - Password Change

en	Attempts

en	Go

en	Clear

en	Purge

en	Purge User Log

en	User Logins

en	IP Address

en	(User Removed)

en	Display Order

en	Log [Total Lines: %d - Non-Matching Items Hidden]

en	Log [Total Lines: %d - All Items Shown]

en	Clear Cacti Log

en	Cacti Log Cleared

en	Error: Unable to clear log, no write permissions.

en	Error: Unable to clear log, file does not exist.

en	Data Query Cache Items

en	Query Name

en	Allow the search term to include the index column

en	Include Index

en	Field Value

en	Index

en	Poller Cache Items

en	Script

en	SNMP Version:

en	Community:

en	OID:

en	User:

en	Script:

en	Script Server:

en	RRD:

en	Cacti technical support page. Used by developers and technical support persons to assist with issues in Cacti. Includes checks for common configuration issues.

en	The Cacti Log stores statistic, error and other message depending on system settings. This information can be used to identify problems with the poller and application.

en	Allows Administrators to browse the user log. Administrators can filter and export the log as well.

en	Poller Cache Administration

en	This is the data that is being passed to the poller each time it runs. This data is then in turn executed/interpreted and the results are fed into the RRDfiles for graphing or the database for display.

en	The Data Query Cache stores information gathered from Data Query input types. The values from these fields can be used in the text area of Graphs for Legends, Vertical Labels, and GPRINTS as well as in CDEF's.

en	Rebuild Poller Cache

en	The Poller Cache will be re-generated if you select this option. Use this option only in the event of a database crash if you are experiencing issues after the crash and have already run the database repair tools. Alternatively, if you are having problems with a specific Device, simply re-save that Device to rebuild its Poller Cache. There is also a command line interface equivalent to this command that is recommended for large systems.

en	NOTE: On large systems, this command may take several minutes to hours to complete and therefore should not be run from the Cacti UI. You can simply run 'php -q cli/rebuild_poller_cache.php --help' at the command line for more information.

en	Rebuild Resource Cache

en	When operating multiple Data Collectors in Cacti, Cacti will attempt to maintain state for key files on all Data Collectors. This includes all core, non-install related website and plugin files. When you force a Resource Cache rebuild, Cacti will clear the local Resource Cache, and then rebuild it at the next scheduled poller start. This will trigger all Remote Data Collectors to recheck their website and plugin files for consistency.

en	Boost Utilities

en	View Boost Status

en	This menu pick allows you to view various boost settings and statistics associated with the current running Boost configuration.

en	Data Source Statistics Utilities

en	Purge Data Source Statistics

en	This menu pick will purge all existing Data Source Statistics from the Database. If Data Source Statistics is enabled, the Data Sources Statistics will start collection again on the next Data Collector pass.

en	RRD Utilities

en	RRDfile Cleaner

en	When you delete Data Sources from Cacti, the corresponding RRDfiles are not removed automatically. Use this utility to facilitate the removal of these old files.

en	Use this utility to display problems with missing rrd files or missing values in rrdfiles. You need enable rrdcheck in Configuration->Settings->Data

en	SNMP Agent Utilities

en	This shows all objects being handled by the SNMP Agent.

en	Rebuild SNMP Agent Cache

en	The SNMP cache will be cleared and re-generated if you select this option. Note that it takes another poller run to restore the SNMP cache completely.

en	This menu pick allows you to view the latest events SNMP Agent has handled in relation to the registered notification receivers.

en	Allows Administrators to maintain SNMP notification receivers.

en	Cacti System Utilities

en	Refresh Interval

en	Overrun Warning

en	Timed Out

en	Other

en	Cannot open directory

en	Directory Does NOT Exist!!

en	Current Boost Status

en	Boost On-demand Updating:

en	Running Processes:

en	Total Poller Items:
uk	Елемент Кольору

en	Total Data Sources:

en	Remaining Data Sources:
uk	Має Джерела Даних

en	TBD

en	Queued Boost Records:

en	Approximate in Process:

en	Total Boost Records:

en	Boost Storage Statistics

en	Database Engine:

en	Current Boost Table(s) Size:

en	Avg Bytes/Record:

en	%d Bytes

en	Max Record Length:

en	Max Allowed Boost Table Size:

en	Estimated Maximum Records:

en	Previous Runtime Statistics

en	Last Start Time:

en	Last End Time:
uk	Останній Запуск

en	Never Run
uk	Ніколи

en	Last Run Duration:

en	%d minutes

en	%d seconds

en	%0.2f percent of update frequency)

en	RRD Updates:

en	MBytes

en	Peak Poller Memory:

en	Max Poller Memory Allowed:

en	Detailed Runtime Statistics
uk	Очистити Статистику

en	Records: %s (ds rows), Time: %s (secs), GetRows: %s (secs), ResultsCycle: %s (secs), FileAndTemplate: %s (secs), LastUpdate: %s (secs), RRDUpdate: %s (secs), Delete: %s (secs)

en	Previous Runtime Timers:

en	Process: %d

en	Status: Running, Remaining: %s (dses), CurrentRuntime: %s (secs), PrevRuntime: %s (secs), PrevProcessed: %10s (ds rows)

en	Status: Idle, PrevRuntime: %s (secs), PrevProcessed: %10s (ds rows)

en	Run Time Configuration

en	Update Frequency:

en	Concurrent Processes:

en	Next Start Time:

en	Maximum Records:

en	Records

en	Maximum Allowed Runtime:

en	Image Caching Status:

en	Cache Directory:

en	Cached Files:

en	Cached Files Size:

en	SNMP Agent Cache

en	OIDs

en	Column Data

en	Scalar

en	SNMP Agent Notification Log

en	Receiver

en	Log Entries

en	Severity Level: %s

en	Click 'Continue' to delete the following VDEF.

en	Delete VDEF

en	Click 'Continue' to duplicate the following VDEF. You can optionally change the title format for the new VDEF.

en	Duplicate VDEF

en	Click 'Continue' to delete the following VDEF's.

en	VDEF Name: %s

en	Remove VDEF Item

en	VDEF Preview

en	VDEF Items [edit: %s]

en	VDEF Items [new]

en	VDEF Item Type

en	Choose what type of VDEF item this is.

en	VDEF Item Value

en	Enter a value for this VDEF item.

en	VDEFs [edit: %s]

en	VDEFs [new]

en	Delete VDEF Item

en	The name of this VDEF.

en	VDEF Name

en	VDEFs that are in use cannot be Deleted. In use is defined as being referenced by a Graph or a Graph Template.

en	The number of Graphs using this VDEF.

en	The number of Graphs Templates using this VDEF.

en	No VDEFs