en	Edit Graph: '%s'.
tr	GRAFİK DÜZENLE

en	Open a ticket at
tr	Yeni Soru Gönder

en	Version %d
tr	versiyonu: %d

en	%0.1f Minutes
tr	0 dakika

en	%d OID
tr	OID

en	%d Repetitions
tr	Tekrarlar

en	%s Thread
tr	İPLİK

en	%s Threads
tr	Konular

en	Start of Business Day
tr	işletmenin Başlangıcı

en	End of Business Day
tr	(mesai bitimine kadar)

en	Show business hours
tr	Çalışma Saatleri

en	The "Distinguished Name" syntax, applicable for both OpenLDAP and Windows AD configurations, offers flexibility in defining user identity. For OpenLDAP, the format follows this structure: "uid=<username>,ou=people,dc=domain,dc=local". Windows AD provides an alternative syntax: "<username>@win2kdomain.local", commonly known as "userPrincipalName (UPN)". In this context, "<username>" represents the specific username provided during the login prompt. This is particularly pertinent when operating in "No Searching" mode, or "Require Group Membership" enabled.

en	Use a separate subfolder for each hosts RRD files. The naming of the RRDfiles will be one of the following:<br><ul><li>&lt;path_cacti&gt;/rra/host_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_id/data_query_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/data_query_id/local_data_id.rrd.</li></ul><br>You can make this change after install by running the CLI script <b>structure_rra_paths.php</b> after you make the change. NOTE: If you change Max Directories value to decrease the number of directories, or if you change the Directory Pattern, empty directories will not be pruned after you rerun the <b>structure_rra_paths.php</b> script.

en	%s MBytes
tr	Mbayt

en	Current Page: %s
tr	Geçerli Sayfa

en	Details %s
tr	Ayrıntılar

en	Report Items %s
tr	Rapor Öğeleri

en	Graph: %s
tr	Grafik

en	Tree: %s
tr	Ağaç:

en	, Branch: %s
tr	Şube:

en	Unable to Connect to Server (%s)
tr	Sunucuya bağlanılamıyor

en	%s Version %s or above is required for %s.

en	The Plugin in the directory '%s' does not include an install function '%s()'. This function must exist for the plugin to be installed.

en	Device '%s' successfully added to Report.

en	The pdp_per_row of '%s' is invalid for RRA '%s' should be '%s'. Consider deleting and allowing Cacti to re-create RRDfile.

en	The number of rows for Cacti RRA id '%s' is incorrect. The number of rows are '%s' but should be '%s'

en	If using the Cacti Performance Booster and choosing a memory storage engine, you have to be careful to flush your Performance Booster buffer before the system runs out of memory table space. This is done two ways, first reducing the size of your output column to just the right size. This column is in the tables poller_output, and poller_output_boost. The second thing you can do is allocate more memory to memory tables. We have arbitrarily chosen a recommended value of 10%% of system memory, but if you are using SSD disk drives, or have a smaller system, you may ignore this recommendation or choose a different storage engine. You may see the expected consumption of the Performance Booster tables under Console -> System Utilities -> View Boost Status.

en	When performing joins, if they are below this size, they will be kept in memory and never written to a temporary file. As this is a per connection memory allocation, care must be taken not to increase it too high. The sum of the join_buffer_size + sort_buffer_size + read_buffer_size + read_rnd_buffer_size + thread_stack + binlog_cache_size + Core MySQL/MariaDB memory should be below 80%. If the recommendation is negative, you must decrease this and or the sort_buffer_size until the recommendation fits within the allowable memory.

en	InnoDB will hold as much tables and indexes in system memory as is possible. Therefore, you should make the innodb_buffer_pool large enough to hold as much of the tables and index in memory. Checking the size of the /var/lib/mysql/cacti directory will help in determining this value. We are recommending 25%% of your systems total memory, but your requirements will vary depending on your systems size.

en	Key Generation Required to Use Plugin

en	In order to use this Plugin, you must first run the genkey.php script in the plugin directory. Once that is complete, you will have a public and private key used to sign your packages.

en	You have not Trusted this Package Author. If you wish to import, check the Automatically Trust Author checkbox

en	See the cacti.log for more information. It could be that you had either an API Key error or the package was tamered with, or the location is not available.

en	See the cacti.log for more information. It could be that you had either an API Key error or the package was tamered with, or the location is not available

en	The XML files appears to be invalid. Please contact the package author

en	Check the package repository file for files that should exist and find the one that is missing

en	The XML files for the package does not exist

en	Import Package Filenames [ None selected imports all, Check to import selectively ]

en	Import Package Templates [ None selected imports all, Check to import selectively ]

en	The *.xml.gz file located on your Local machine to Upload and Import.

en	If checked, Cacti will automatically Trust the Signer for this and any future Packages by that author.

en	Replace Data Source and Graph Template Suggested Value Records. Graphs and Data Sources will take on new names after either a Data Query Reindex or by using the forced Replace Suggested Values process.

en	Main / Remote Status

en	WARNING: %s is out of sync with the Poller Interval for poller id %d! The Poller Interval is %d seconds, with a maximum of a %d seconds, but %d seconds have passed since the last poll!

en	WARNING: There are %d processes detected as overrunning a polling cycle for poller id %d, please investigate.

en	WARNING: Poller Output Table not empty for poller id %d. Issues: %d, %s.

en	ERROR: The spine path: %s is invalid for poller id %d. Poller can not continue!

en	Maximum runtime of %d seconds exceeded for poller id %d. Exiting.

en	WARNING: PollerID:%s with Name:%s is in Heartbeat Status

en	Poller in Heartbeat Mode

en	RRD check is disabled, please enable in Configuration -> Settings -> Data

en	%d day
tr	%d Gün

en	%d days
tr	%d Gün

en	Cacti Settings (%s)%s

en	Changing Permission Model Warning

en	Changing Permission Model will alter a users effective Graph permissions.

en	After you change the Graph Permission Model you should audit your Users and User Groups Effective Graph permission to ensure that you still have adequate control of your Graphs. NOTE: If you want to restrict all Graphs at the Device or Graph Template Graph Permission Model, the default Graph Policy should be set to 'Deny'.

en	The Template Import Succeeded.

en	See the cacti.log for more information, and review the XML file for proper syntax. The error details are shown below.<br><br><b>Errors:</b><br>%s

en	The Template XML file "%s" validation failed

en	Import Files [ If Files are missing, locate and install before using ]

en	Import Templates [ None selected imports all, Check to import selectively ]

en	Met: %d

en	Unmet: %d

en	Some CDEF Items will not import due to an export error! Contact Template provider for an updated export.

en	MySQL/MariaDB Memory Statistics (Source: MySQL Tuner)

en	Reduce MySQL/MariaDB Memory to less than 80% of System Memory. Preserve additional Cache Memory for RRDfiles if the Database is on the same system as the RRDfiles. See Core and Client Totals below for explanation of calculation method.

en	Reduce Total Core Memory

en	Calculation Formula

en	Max Connection Memory Possible

en	Reduce Total Client Memory

en	NOTE: On large systems, this command may take several minutes to hours to complete and therefore should not be run from the Cacti UI. You can simply run 'php -q cli/rebuild_poller_cache.php --help' at the command line for more information.

en	Use this utility to display problems with missing rrd files or missing values in rrdfiles. You need enable rrdcheck in Configuration->Settings->Data

en	Records: %s (ds rows), Time: %s (secs), GetRows: %s (secs), ResultsCycle: %s (secs), FileAndTemplate: %s (secs), LastUpdate: %s (secs), RRDUpdate: %s (secs), Delete: %s (secs)

en	Process: %d

en	Status: Running, Remaining: %s (dses), CurrentRuntime: %s (secs), PrevRuntime: %s (secs), PrevProcessed: %10s (ds rows)

en	Status: Idle, PrevRuntime: %s (secs), PrevProcessed: %10s (ds rows)