en	%d Minute
ja	%d分

en	Version %d
ja	バージョン: %d

en	Licensing Related
ja	ライセンス関連のFAQ

en	%s Minutes
ja	%s分

en	Show business hours
ja	営業時間

en	%s Hour
ja	%s時

en	The "Distinguished Name" syntax, applicable for both OpenLDAP and Windows AD configurations, offers flexibility in defining user identity. For OpenLDAP, the format follows this structure: "uid=<username>,ou=people,dc=domain,dc=local". Windows AD provides an alternative syntax: "<username>@win2kdomain.local", commonly known as "userPrincipalName (UPN)". In this context, "<username>" represents the specific username provided during the login prompt. This is particularly pertinent when operating in "No Searching" mode, or "Require Group Membership" enabled.

en	Use a separate subfolder for each hosts RRD files. The naming of the RRDfiles will be one of the following:<br><ul><li>&lt;path_cacti&gt;/rra/host_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_id/data_query_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/data_query_id/local_data_id.rrd.</li></ul><br>You can make this change after install by running the CLI script <b>structure_rra_paths.php</b> after you make the change. NOTE: If you change Max Directories value to decrease the number of directories, or if you change the Directory Pattern, empty directories will not be pruned after you rerun the <b>structure_rra_paths.php</b> script.

en	Database User: %s
ja	あなたのデータベースユーザがテーブルを作成する権限がありません。私たちは、単にテーブルを空にすることによって復元しようとします。これは、a）あなたは同じデータベース構造でWordPressのバージョンから復元しているのように動作する必要があり、およびb）あなたのインポートされたデータベースは、すでにインポートサイトに存在しない任意のテーブルが含まれていません。

en	When performing joins, if they are below this size, they will be kept in memory and never written to a temporary file. As this is a per connection memory allocation, care must be taken not to increase it too high. The sum of the join_buffer_size + sort_buffer_size + read_buffer_size + read_rnd_buffer_size + thread_stack + binlog_cache_size + Core MySQL/MariaDB memory should be below 80%. If the recommendation is negative, you must decrease this and or the sort_buffer_size until the recommendation fits within the allowable memory.

en	%s will divide the innodb_buffer_pool into memory regions to improve performance for versions of MariaDB less than 10.5. The max value is 64, but should not exceed more than the number of CPU cores/threads. When your innodb_buffer_pool is less than 1GB, you should use the pool size divided by 128MB. Continue to use this equation up to the max the number of CPU cores or 64.

en	%s will divide the innodb_buffer_pool into memory regions to improve performance for versions of MySQL upto and including MySQL 8.0. The max value is 64, but should not exceed more than the number of CPU cores/threads. When your innodb_buffer_pool is less than 1GB, you should use the pool size divided by 128MB. Continue to use this equation up to the max of the number of CPU cores or 64.