en	%0.1f Minutes
hi	घंटे

en	%d Repetitions
hi	repetitions

en	%s Thread
hi	थ्रेड

en	%s Threads
hi	लड़ियाँ

en	Show business hours
hi	कार्यदिवस

en	The "Distinguished Name" syntax, applicable for both OpenLDAP and Windows AD configurations, offers flexibility in defining user identity. For OpenLDAP, the format follows this structure: "uid=<username>,ou=people,dc=domain,dc=local". Windows AD provides an alternative syntax: "<username>@win2kdomain.local", commonly known as "userPrincipalName (UPN)". In this context, "<username>" represents the specific username provided during the login prompt. This is particularly pertinent when operating in "No Searching" mode, or "Require Group Membership" enabled.

en	Use a separate subfolder for each hosts RRD files. The naming of the RRDfiles will be one of the following:<br><ul><li>&lt;path_cacti&gt;/rra/host_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_id/data_query_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/data_query_id/local_data_id.rrd.</li></ul><br>You can make this change after install by running the CLI script <b>structure_rra_paths.php</b> after you make the change. NOTE: If you change Max Directories value to decrease the number of directories, or if you change the Directory Pattern, empty directories will not be pruned after you rerun the <b>structure_rra_paths.php</b> script.

en	%s MBytes
hi	मे. बाइट्स

en	Current Page: %s
hi	वर्तमान पृष्ठ

en	Graph: %s
hi	Symbol for file attachment annotations

en	Tree: %s
hi	दिए गए शब्दों को व्यवस्थित करें और सबसे उपयुक्त अर्थ प्रदान करने वाले विकल्प का चयन करें -> 1.बीज 2.पुआल 3.उर्वरक 4.फसल 5.पेड़

en	, Branch: %s
hi	शाखा:

en	Unable to Connect to Server (%s)
hi	" LDAP कन्नै कनैक्ट करने च असमर्थ"

en	When performing joins, if they are below this size, they will be kept in memory and never written to a temporary file. As this is a per connection memory allocation, care must be taken not to increase it too high. The sum of the join_buffer_size + sort_buffer_size + read_buffer_size + read_rnd_buffer_size + thread_stack + binlog_cache_size + Core MySQL/MariaDB memory should be below 80%. If the recommendation is negative, you must decrease this and or the sort_buffer_size until the recommendation fits within the allowable memory.

en	Differences
hi	भिन्नताएँ:

en	Met: %d
hi	मिले।