en	Open a ticket at
he-il	פתח קריאה

en	%s Thread
he-il	חוט

en	%s Threads
he-il	אשכולות

en	Show business hours
he-il	שעות פעילות

en	The "Distinguished Name" syntax, applicable for both OpenLDAP and Windows AD configurations, offers flexibility in defining user identity. For OpenLDAP, the format follows this structure: "uid=<username>,ou=people,dc=domain,dc=local". Windows AD provides an alternative syntax: "<username>@win2kdomain.local", commonly known as "userPrincipalName (UPN)". In this context, "<username>" represents the specific username provided during the login prompt. This is particularly pertinent when operating in "No Searching" mode, or "Require Group Membership" enabled.

en	Use a separate subfolder for each hosts RRD files. The naming of the RRDfiles will be one of the following:<br><ul><li>&lt;path_cacti&gt;/rra/host_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_id/data_query_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/local_data_id.rrd,</li><li>&lt;path_cacti&gt;/rra/device_hash/device_id/data_query_id/local_data_id.rrd.</li></ul><br>You can make this change after install by running the CLI script <b>structure_rra_paths.php</b> after you make the change. NOTE: If you change Max Directories value to decrease the number of directories, or if you change the Directory Pattern, empty directories will not be pruned after you rerun the <b>structure_rra_paths.php</b> script.

en	%s MBytes
he-il	מגה בייטים

en	Unknown Type = '%s'.
he-il	סוג לא ידוע

en	Current Page: %s
he-il	עמוד נוכחי

en	Scheduled Events %s
he-il	משימות מתוזמנות

en	Graph: %s
he-il	Symbol for file attachment annotations

en	Tree: %s
he-il	עץ

en	, Branch: %s
he-il	סניף:

en	No - %s
he-il	עבר מ-%s ל-%s

en	%s - N/A
he-il	אין

en	%s - No
he-il	עבר מ-%s ל-%s

en	Unable to Connect to Server (%s)
he-il	לא ניתן להתחבר לשרת

en	When performing joins, if they are below this size, they will be kept in memory and never written to a temporary file. As this is a per connection memory allocation, care must be taken not to increase it too high. The sum of the join_buffer_size + sort_buffer_size + read_buffer_size + read_rnd_buffer_size + thread_stack + binlog_cache_size + Core MySQL/MariaDB memory should be below 80%. If the recommendation is negative, you must decrease this and or the sort_buffer_size until the recommendation fits within the allowable memory.

en	Differences
he-il	הבדלים:

en	Met: %d
he-il	MET

en	Delete User Group
he-il	משתמש חסר.

en	Copy User Group
he-il	דרגת משתמש